Course: GFM 101 Fundamentals of Green Facilities Management

Activity: Lab Activity #9

Facility Emergency Manual

State, Indian Tribal, and local officials develop and adopt mitigation plans to meet the requirements of the Stafford Act. The Multi-Hazard Mitigation Planning Guidance provides the official guidance on these requirements and procedures for approval of hazard mitigation plans.

Research Assignment:

Obtain A Copy (preferably electronic, please) of a Facility Emergency Manual. The Facility/Building and its manual should be familiar to you, and be prepared to discuss it in class.

Web Resource:

Click here to download from the FEMA website the section titled Hazard Mitigation Planning Overview.