Title: Assignment: Research Project
Course: GFM 101 Fundamentals of Green Facilities Management > Section: GFM 101 Fundamentals of Green Facilities Management

Assignment: Research Project

Research Project: Basements and Poor IEQ/IAQ

The image presented is from the EPA Interior Air Quality House.  Look Up This Room (on EPA’s Link Below) and Identify The Four Potential Causes of Poor IAQ.

Click here to download the U.S. EPA Interior Air Quality House simulation website.

Write a 1-2 page report about the identification of the four potential causes of poor IAQ according to your research.

Once you have completed the assignment go to the Dropbox Project in the Content Menu and click on "Dropbox: Unit 7 Research Project” to learn how to submit the assignment.