Title: Audio Visual
Course: GFM 101 Fundamentals of Green Facilities Management > Section: GFM 101 Fundamentals of Green Facilities Management

Audio Visual

FEMA Overview of Risk Management

By Federal Emergency Management Agency (FEMA)

There are a number of methods and means to conduct a building risk assessment, and the steps can be accomplished in different sequences.
However, they all have one common objective, which is to apply a quantitative assessment process that identifies those assets at highest risk
and evaluate mitigation measures that can reduce that risk.

Click here if video cannot be viewed.