Course: GFM 101 Fundamentals of Green Facilities Management

Reading and Multimedia Assignments

Go to page (2/3)
Multimedia Assignment 1

Sustainable Facilities Tool: EXPLORE Interior Workspaces

In this interactive module, you will explore interior office workspaces and learn about sustainable design best practices as you compare materials, etc. Click on the links below to explore these workspaces.

Explore  - Sustainable Workplaces

- Private Office

- Reception/Lobby

- Open Office Area

- Enclosed Conference

- Tenant Restroom

- Tenant Corridor

- Open Teaming Space

- Break/Pantry

- Support Area

- Computer/LAN Room

(Content Courtesy of Sustainable Facilities Tool – U. S. General Services Administration)