Course: GFM 101 Fundamentals of Green Facilities Management

Reading and Multimedia Assignments

Go to page (1/3)
Reading Assignment 1

Click here to read The Role of Buildings and the Case for Whole Building Design – High Performing Buildings article on the Whole Building Design website.

(Content Courtesy of Whole Building Design Guide – National Institute of Building Sciences)