Course: GFM 101 Fundamentals of Green Facilities Management

Activity: Lab Activity #10

Building Adaptability In Historic Museum Standards

This lab assignment is a guided, clinical field lab activity. Aiding our focus and understanding of today’s smart building design/construction, operation, and maintenance (perhaps with a historical legacy), the Abraham Lincoln Family Home is an excellent example of a National Historic Site that maintains it historical presence while maintaining a very intelligent use of energy to protect its museum legacy.

Web Resource:

Click here to download the Lincoln Home National Historic Site from the National Park Service website.