Title: Activity: Lab 4
Course: GFM 101 Fundamentals of Green Facilities Management > Section: GFM 101 Fundamentals of Green Facilities Management

Activity: Lab 4

Springfield’s City Water, Light & Power – Energy Division

This lab assignment is a guided, clinical field lab activity. Aiding in our focus and understanding of today’s optimizing energy through conservation (and ultimately Net Zero Energy), Springfield’s CWLP (City Water, Light and Power) is an excellent green facility. And it’s centerpiece is Dallman 4, a “state-of-the-art” smart electric generation plant.

Web Resources:

Click here to view the Department of City Water, Light and Power of Springfield, Illinois.

Click here to view the Water Conservation Program from the Department of City Water, Light and Power of Springfield, Illinois.