Course: GFM 101 Fundamentals of Green Facilities Management

Assignment: Research Task

Assignment: Research Task

Find The Environmental Requirements of Your Next Purchase

Please research one of the GFM services shown in this website listed below. Read their websites, their green services, and be prepared to explain the information you found about that green SERVICE. A specification sheet with green attributes is expected.

The Green Products Compilation (GPC) is presented as an educational tool to facilitate the procurement of green products and services. The products listed are those for which the EPA, DOE, or USDA have issued designations or otherwise provided guidance for environmental or energy attributes. This interactive tool consolidates and organizes information from these federal green purchasing programs in one place, saving you from researching multiple web sites. It allows Federal purchasers to search, sort, and identify sustainable products and their associated guidance documentation to facilitate green purchasing decisions. Get started now and make your next purchase a sustainable one.

Web Resources for assignment.

Click here to download Sustainable Facilities Tool: About the Green Procurement Compilation.
Click here to download Sustainable Facilities Tool: Green Procurement Compilation.

Once you have completed the assignment go to the Dropbox Folder in the Content Menu and click on "Dropbox: Unit 6 Research Task” to learn how to submit the assignment.