Course: GFM 101 Fundamentals of Green Facilities Management

Lab Activity

page 1
Lab 1 (Part 2)

What Exactly is a “State-of-the-Art” Smart Building (Part 2)?

What are the typical major segments of energy use in a commercial building?

This lab assignment is a guided, clinical field lab activity. Aiding our focus and understanding of today’s smart building design/construction, operation, and maintenance, Lincoln Land Community College’s new Workforce Careers Center is an excellent green facility (LEED “Silver”). This guided tour consists of the second portion, and will be a guided facility/systems operation and maintenance (O&M) tour inside and out.

Click here to read articles on Energy on the U.S. Energy Information Administration website.

Save the completed Lab Exercise document on your computer. Submit your document in the Dropbox found on the Course Home page.
Click on the file below to download the Lab Exercise document.
- L1_Lab1.pdf (98.61 KB)