Title: Lab Activity
Course: GFM 101 Fundamentals of Green Facilities Management > Section: GFM 101 Fundamentals of Green Facilities Management

Lab Activity

page 1
Lab 1 (Part 1)

What Exactly is a “State-of-the-Art” Smart Building (Part 1)?

This lab assignment is a guided, clinical field lab activity. Aiding our focus and understanding of today’s building design/construction, operation, and maintenance, Lincoln Land Community College’s new Workforce Careers Center is an excellent green facility. The guided tour consists of two portions: First, revisiting the project’s very beginning with the College’s Statement of Needs and subsequent response by its Architectural/Engineering team. (The second portion will be a guided facility/systems tour inside and out).

To use the Sustainable Facilities Tool website to explore sustainable workspaces, click here.

Save the completed Lab Exercise document on your computer. Submit your document in the Dropbox found on the Course Home page.

Click on the file below to download the Lab Exercise document.
- L1_Lab1.pdf (98.61 KB)