Title: GFM 101 Fundamentals of Green Facilities Management

GFM 101 Fundamentals of Green Facilities Management
  GFM 101 Fundamentals of Green Facilities Management Introduction
  Student INTAKE Form
  Dropbox
    Dropbox Introduction
  Unit 1
    Unit 1 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading and Multimedia Assignments
      Glossary
      Additional Student Web Resources
      Lab Activity
      Quiz
      Additional Student Web Resources & Links/Uploads
        Buildings Energy Data Book – Department of Energy
        Illinois Green Economy Network
        “Glossary”. U.S. Energy Information Administration (EIA)
    Lesson 2
      Lesson 2 Introduction
      Additional Student Web Resources
        Department Of Energy – Building Energy Data Book Glossary
        Energy Information Administration Tools – Glossary
        I-BEAM – Environmental Protection Agency
        Sustainable Facility Tool – U.S. General Service Administration
        Whole Building Design Guide – National Institute of Building Sciences
        Whole Building Design Guide – National Institute of Building Sciences
        Wikipedia - About Wikipedia
        Wikipedia - Energy Information Administration
      Lab Activity
      Quiz
  Unit 2
    Unit 2 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading and Multimedia Assignments
      Addtional Student Web Resources
        Sustainable Facilities Tool - Facility Manager
        Whole Building Design Guide - Design Objectives – Sustainable
        Whole Building Design Guide – Design Guidance
        Whole Building Design Guide – Design Objectives
        Whole Building Design Guide – Resource Guide
        Whole Building Design Guide – Site Map w/ Resource Page Listings
      Quiz
    Lesson 2
      Lesson 2 Introduction
      Reading and Multimedia Assignments
      Additional Student Web Resources
        Sustainable Facilities Tool - Green Procurement Compilation
        Sustainable Facilities Tool - Learn
        Sustainable Facilities Tool - Plan
        Sustainable Facilities Tool - Share
      Exam
  Unit 3
    Unit 3 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading and Multimedia Assignments
      Additional Student Web Resources
        Integrative Design Process for Sustainable Facilities Tool
        Siemens - Sustainable Cities
        Sustainable Facilities Tool - Learn
        The Role of Buildings and the Case for Whole Building Design
        Whole Building Design Guide - Low Impact Development Practices
      Lab Activity
    Lesson 2
      Lesson 2 Introduction
      Reading and Multimedia Assignments
      Lab Activity
  Unit 4
    Unit 4 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Video
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Activity: Lab 4
      Assignment: Research Task
      Weblinks: Resources on Different Energy Sources
        Alternative Energy
        Distributed Energy Resources (DER)
        Net Zero Energy Buildings
    Websites: Optimizing Energy Use
      Integrative Design Process
      The Role of Buildings and the Case for Whole Building Design
  Unit 5
    Unit 5 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Visual
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Activity: Lab #5
      Exam 2
    Weblinks - Protect and Conserve Water
      Sustainable Facilities Tool – Water System Overview
      Whole Building Design Guide – Conserve and Protect Water
      Whole Building Design Guide – Water Conservation
  Unit 6
    Unit 6 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading and Audio Visual
      Assignment: Research Task
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Assignment: Research Task
      Activity: Lab Activity #6
  Unit 7
    Unit 7 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Visual
      Enhance Indoor Environmental Quality (IEQ)
        Enhance Indoor Environmental Quality (IEQ)
        EPA: Indoor Air Quality (IAQ)
        Sustainable Facilities Tool: Indoor Environmental Quality
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Assignment: Research Project
      Exam 3
    Enhance Indoor Environment
      Integrative Design Process
      The Role of Buildings and the Case for Whole Building Design
  Unit 8
    Unit 8 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Visual
      Unit 8 Quiz
      Optimizing Operational and Maintenance Practices
        Optimize Operational and Maintenance Practices: Recommendations
        Sustainable O&M Practices
    Lesson 2
      Lesson 2 Introduction
      Reading
      Activity: Lab Activity #8
    Building Designs
      Integrative Design Process
      Whole Building Design
  Unit 9
    Unit 9 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Visual
      Activity: Lab Activity #9
      Hazard Mitigation
        Flood Resistance of the Building Envelope
        Journal of the National Institute of Building Sciences
        Natural Hazards and Security
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Unit 9 Quiz
      Federal Emergency Management Agency (FEMA)
        Federal Emergency Management Agency (FEMA)
        Mitigation
    Building Designs
      Integrative Design Process
      The Role of Buildings and the Case for Whole Building Design
  Unit 10
    Unit 10 Introduction
    Lesson 1
      Lesson 1 Introduction
      Reading
      Audio Visual
      Unit 10 Quiz
      Historical Structure Preservation
        National Center for Preservation Technology and Training
        The Preparation and Use of Historic Structure Reports – National Park Service
    Lesson 2
      Lesson 2 Introduction
      Reading
      Audio Visual
      Activity: Lab Activity #10
      Historic Preservation
        National Trust for Historic Preservation
        U.S. National Park Service- Preserving
        U.S. National Park Service- Reconstructing
        U.S. National Park Service- Rehabilitating
        U.S. National Park Service- Restoring
    Building Design
      Integrative Design Process
      The Role of Buildings and the Case for Whole Building Design
  Unit 11
    Unit 11 Introduction
    Final Exam