Course: GFM 101 Fundamentals of Green Facilities Management

Reading and Multimedia Assignments

Go to page (11/11)
Multimedia Assignments 3 and 4

Multimedia Assignment 3
(Click on the link below to watch the video on YouTube)

Green Careers: Sustainable Futures - Benchmark Sequence

This video is the first episode from an educational series "Green Careers: Sustainable Futures," and talks about Benchmark Asset Managers and its role in the finance career cluster.

Multimedia Assignment 4
(Click on the link below to watch the video on YouTube)

GOOD LOOK: Green Jobs

This video talks about Community Environmental Center, a New York based organization that is working towards reducing greenhouse gas emissions and at the same time creating green jobs in the process.