Title: Lab Activity
Course: GFM 101 Fundamentals of Green Facilities Management > Section: GFM 101 Fundamentals of Green Facilities Management

Lab Activity

page 1
Lab 3

Guided Tour of “State-of-the-Art” Green Facility – Erin’s Pavilion at Southwind Park (Part 1)

Your lab assignment is a guided, clinical field lab activity. Aiding our focus and understanding of today’s building design/construction, operation, and maintenance, Springfield Park District’s new Southwind Park is an excellent green facility. Its green centerpiece is Erin’s Pavilion.

(Related Links: Southwind Park, Erin’s Pavilion)

Save the completed Lab Exercise document on your computer. Submit your document in the Dropbox found on the Course Home page.

Click on the file below to download the Lab Exercise document
- U3_L1_Lab3.pdf (339.65 KB)