Title: Reading Assignments
Course: SGRD 105 Microgrids and Renewable Energies > Section: SGRD 105 Microgrids and Renewable Energies

Reading Assignments

Go to page (1/2)
Energy Storage Technologies
These notes provide a brief introduction to the basics of lead-acid batteries including the equivalent circuit model of a real battery, battery capacity, capacity variation with discharge rate, battery efficiency, and system sizing.  A brief review of alternative storage technologies is also presented.

Click here to download the Unit 8 Notes
- sgrd105.unit8.pdf (242.83 KB)