Course: SGRD 105 Microgrids and Renewable Energies

Reading Assignments

Go to page (2/2)
Fuel Cell Case Study
Read Case Study: Fuel Cells Increase Reliability at First National Bank of Omaha Technology Center
This DOE pamphlet describes the installation and operation of a fuel cell system for primary power, backup power, heeting and cooling at a bank data center in Omaha Nebraska.
Credits

U.S. Department of Energy, Public domain

Click here to access the above publication online.
Click here to download the above publication
- fccs_omaha10.pdf (755.35 KB)