Title: Reading Assignments
Course: SGRD 105 Microgrids and Renewable Energies > Section: SGRD 105 Microgrids and Renewable Energies

Reading Assignments

Go to page (1/2)
Combined Heat and Power: A Clean Energy Solution
This DOE pamphlet describes combined heat and power (CHP) which is cogeneration of electrical and thermal energy from a single fuel source.  Benefits of CHP and barriers to CHP deployment are discussed.
Credits
U.S. Deparment of Energy and U.S. Environmental Protection Agency

Click here to access the above publication online.
Click here to download the above publication
- chp_clean_energy_solution.pdf (946.03 KB)