Course: SGRD 106 Energy Efficient Buildings

Reading and Multimedia Assignments

Go to page (4/4)
Unit 6 Assignment
Folly of Building Integrated Wind
Once you complete your reading and finish watching the video, open the attached file. Read the instructions carefully and record your answers.

Save your work in a document on your computer. Submit your document in the Dropbox found on the Course Home page.

Note: It is important that you complete the reading and this assignment, before attempting the Unit 6 quiz.

Click on the file below to download the above document
- SGRD 106_Unit 6 On-site Energy Production_Assignment-1.pdf (191.98 KB)