Course: SGRD 106 Energy Efficient Buildings

Reading and Multimedia Assignments

Go to page (2/4)
Reading Assignment 2
Credits

Kibert, Charles J. Sustainable Construction: Green Building Design and Delivery. Hoboken, NJ: John Wiley & Sons, 2008. Print.

Read Sustainable Construction Chapters 4,5,6

These chapters summarize green building assessment methods throughout the world.  The two predominant rating systems within the United States are then discussed in greater detail.