Title: Unit 6 Quiz
Course: SGRD 106 Energy Efficient Buildings > Section: SGRD 106 Energy Efficient Buildings

Q: Renewable energy can come from new capacity at an existing hydroelectric project.
- True
- False
A: True

Q: Which of the following is not a type of renewable energy?
- Wind
- Solar
- Biomass
- Hydrocarbon
A: Hydrocarbon

Q: The type of energy that is converted using wind turbines is:
- Linear
- Kinetic
- Static
- Directional
A: Kinetic

Q: Traditional wind turbines were used to pump water or grind grain.
- True
- False
A: True

Q: Biomass energy comes from the combustion of plant materials to turn turbines.
- True
- False
A: True

Q: This type of fuel is used to augment or replace traditional fossil based fuels.
- Biofuels
- Coal
- Hydrogen
- Natural Gas
A: Biofuels

Q: The systems that convert solar energy into electricity are referred to as:
- Sunlight systems
- Geothermal systems
- Photovoltaic Systems
- Solar-thermal Systems
A: Photovoltaic Systems

Q: Geothermal systems are loops in the ground that provide stable temperatures for the heating and cooling systems to use.
- True
- False
A: False

Q: Cogeneration makes use of waste heat from energy production to offset heatingand cooling need.
- True
- False
A: True

Q: Electricity produced by the movement of water is called:
- Solar Power
- Hydro Power
- Geothermal Power
- Combustion Power
A: Hydro Power