Title: Unit 3 Quiz
Course: SGRD 106 Energy Efficient Buildings > Section: SGRD 106 Energy Efficient Buildings

Q: “Passive Designs” typically have little or no moving parts or mechanical processes.
- True
- False
A: True

Q: When considering the local climate of a site, you should pay attention to the air, temperature and humidity.
- True
- False
A: True

Q: Which of the following site conditions should be considered in a passive design?
- Terrain and Vegetation
- Development Proximity
- Travel Distance
- All of the above
A: Terrain and Vegetation

Q: Thermal__________should be an important aspect of any passive design strategy.
- Massing
- Stability
- Storage
- All of the above
A: All of the above

Q: Daylight in a building has negative psychological effects.
- True
- False
A: False

Q: Proper daylighting in retail environments leads to increased sales.
- True
- False
A: True

Q: One of the largest internal energy loads in a building is lighting.
- True
- False
A: True

Q: Passive ventilation often uses the________effect to induce air movement.
- Thermal Chimney
- Venturi
- Galileo
- a and b
- b and c
- a and c
A: a and b

Q: Higher efficiency windows have which of the following characteristics:
- Low-e glazing
- Low thermal conductance
- High Visible Transmittance
- All of the above
A: All of the above

Q: Higher efficiency windows have which of the following characteristics:
- Reflectance
- Albedo
- Conformity
- Resistance
A: Albedo