Course: SGRD 106 Energy Efficient Buildings

Reading and Multimedia Assignments

Go to page (3/4)
Reading Assignment 3
Why Green often Isn’t

This article discusses the failures of the rating systems to accurately predict the true performance of the “green” buildings.  Several factors lead to this scenario and make some of the older buildings perform better than new high-efficiency ones.
Click here to read the article