Title: Unit 2 Quiz
Course: SGRD 106 Energy Efficient Buildings > Section: SGRD 106 Energy Efficient Buildings

Q: Green Building assessment systems are used for all new buildings.
- True
- False
A: False

Q: Energy Modeling systems rely on real energy consumption.
- True
- False
A: False

Q: The acronym USGBC stands for:
- United States Green Building Challenge
- United States Green Building Council
- Universal Strategic Green Building Consultants
- Universal Statute for Green Building Construction
A: United States Green Building Council

Q: We currently operate under what version of LEED?
- 1.0
- 2.0
- 3.0
- 4.0
A: 4.0

Q: The first ANSI approved protocol for green buildings is:
- LEED
- Green Globes
- BREEAM
- Green Star
A: Green Globes

Q: BREEAM is a rating system used primarily in what country?
- Australia
- Great Britain
- Germany
- Japan
A: Great Britain

Q: CASBEE is a rating system used primarily in what country?
- Australia
- Great Britain
- Germany
- Japan
A: Japan

Q: The rating of a building concludes once construction is completed.
- True
- False
A: False

Q: LEED Accredited Professional is the highest level of credential in the LEED system.
- True
- False
A: False

Q: The highest level of LEED certification is:
- Silver
- Gold
- Platinum
- Titanium
A: Platinum