Title: Reading
Course: HAC 131 Refrigeration & Air Conditioning 1 > Section: HAC 131 Refrigeration & Air Conditioning 1

Reading

Leak Detection, Cleanup, and Evacuation

Please read Chapter 8 in the text and the following link from wikipedia that discusses the topic of Vaccuum Pumps.

Click here to read the articles about Vaccuum Pumps.