Course: HAC 131 Refrigeration & Air Conditioning 1

Reading

Matter and Energy

Please make sure to read from the text, Pgs. 27-35.  Also, read the articles that are from wikipedia on the different theories pertaining to matter and energy.

Click here to download and read about Matter.
Click here to download and read about Boyle's Law.
Click here to download and read about Dalton's Law.
Click here to download and read about Charles's Law.
Click here to download and read about Specific Gravity.
Click here to download and read about Specific Volume.
Click here to download and read about Watt.
Click here to download and read about Horsepower.
Click here to download and read about British Thermal Unit (BTU).