Title: Lecture: Leak Detection, System Evacuation, and System Clean Up
Course: HAC 131 Refrigeration & Air Conditioning 1 > Section: HAC 131 Refrigeration & Air Conditioning 1

Lecture: Leak Detection, System Evacuation, and System Clean Up

Leak Detection, System Evacuation, and System Clean Up

Click on the item below to download the Lecture Power Point of this presentation
- Unit 12.pptx (4.51 MB)