Title: Reading
Course: HAC 131 Refrigeration & Air Conditioning 1 > Section: HAC 131 Refrigeration & Air Conditioning 1

Reading

Heat and Temperature

The following articles from wikipedia on the topics of temperature, heat transfer, sensible heat, and latent heat define and describe a variety of concepts pertaining to the topics.  Please click on each link and read thouroughly the subject matter and links provided in each web page.

Click here to view the temperature webpage from wikipedia.
Click here to view the heat transfer webpage from wikipedia.
Click here to view the sensible heat webpage from wikipedia.
Click here to view the latent heat webpage from wikipedia.