Course: ELT 102 Basic Electricity & Wiring

Unit 6 Test

Test

Complete the following test.  The test is one that focuses on Parallel Circuits.  Once you have completed the written activity go to the Dropbox Folder in the Content Menu and click on "Dropbox: Unit 6 Test"  to learn how to submit the assignment.
Click on item below to download Unit 6 Test.
- ELT 102 Test 3 parallel test 10-23 13.docx (108.49 KB)