Course: ELT 102 Basic Electricity & Wiring

Reading

(1/2)
Watts Law & Circuit Components

Read "Chapter 4 Circuit Components" in the textbook Electricity Principles & Applications,8th edition, Richard J. Fowler on pages 65-103.   This chapter will cover common electrical components.  Each of the common components covered by giving information about their make-up and uses.