Title: Reading
Course: ELT 102 Basic Electricity & Wiring > Section: ELT 102 Basic Electricity & Wiring

Reading

(1/3)
Series Circuits

Read "Chapter 5 Multiple-Load Circuits " in the textbook Electricity Principles & Applications,8th edition, Richard J. Fowler on pages 114 -122 (Sections 5-5 to 5-6).   These sections of chapter 5 will explain the marking of construction, characteristics and applications of a Parallel multi-load circuit.

Read “Chapter 5  Series and Parallel Circuits” in the online text book Lessons in Electric Circuits, Volume I, DC, 5^th edition, Tony R. Kuphaldt on pages 129 - 169.  This online book can be downloaded by clicking here.  Chapter 5 will introduce series and parallel circuits characteristics.