Title: Lab Session
Course: ELT 102 Basic Electricity & Wiring > Section: ELT 102 Basic Electricity & Wiring

Lab Session

Hands-on Lab Sessions 13 and 14

During these two lab sessions the following lab items will need to be completed: (Note: All labs will be handed out in class.).

- Any uncompleted lab or part of a lab from prior sessions must be completed before starting the labs items for this week.
- Each student must bring in LAB 12 for credit.  They must be record in their lab composition Notebook that was explained in week 1.
- Lab 13 – Wiring 1 (10 points).
- Lab 14 – Wiring 2 (10 points).