Course: ELT 102 Basic Electricity & Wiring

Reading

Series Circuits

Read "Chapter 5 Multiple-Load Circuits” in the textbook Electricity Principles & Applications, 8th edition, Richard J. Fowler on pages 104 -114 (Stop at Section 5-5).   These sections of chapter 5 will explain the characteristics, construction and applications of a Series multi-load circuit.

Read “Chapter 5  Series and Parallel Circuits” in the online text book Lessons in Electric Circuits, Volume I, DC, 5^th edition, Tony R. Kuphaldt on pages 129 - 169.  This online book can be downloaded by clicking here.  Chapter 5 will introduce series and parallel circuits characteristics.