Course: ELT 102 Basic Electricity & Wiring

Reading

(1/2)
Series-Parallel Circuits

Review the Sections of "Chapter 5 Multiple-Load Circuits " in the textbook Electricity Principles & Applications,8th edition, Richard J. Fowler on pages 104 -114 (Stop at Section 5-6).   This Week is a review of the sections of chapter 5 which explained series and parallel multi-load circuits and their characteristics.

Read the Sections of "Chapter 5 Multiple-Load Circuits" in the textbook Electricity Principles & Applications,8th edition, Richard J. Fowler on pages 123 -130 (Sections 5-7 and 5-8).   These sections will introduce Series-Parallel Circuits and an application of Series Parallel circuits.