Title: Lesson 1 Reading Assignment
Course: ELEC 179 Introduction to Electronic Principles > Section: ELEC 179 Introduction to Electronic Principles

Lesson 1 Reading Assignment

Ohm's Law

Read text chapter 11, sections 2 to 6 and section 8.

Ohm’s Law Class Presentation - During this discussion session students will learn about relationship between voltage, current and resistance through a hands on lab activity that will use meters, power supplies and various fixed resistors.