Title: WIND 200WH Wind Power Delivery Systems

WIND 200WH Wind Power Delivery Systems
  WIND 200WH Wind Power Delivery Systems Introduction
  Student INTAKE Form
  Module 1
    Module 1 Introduction
    Arc Flash Review: OSHA Guidelines
      Arc Flash Review: OSHA Guidelines
    Arc Flash Review: Accident Video
      Arc Flash Review: Accident Video
    Arc Flash Review: Arc Flash Caused by Overload Condition
      Arc Flash Review: Arc Flash Caused by Overload Condition
    Lock Out/Tag Out
      Lock Out/Tag Out
  Module 2
    Module 2 Introduction
    How the Induction Motor Works
      How the Induction Motor Works
    Power Electronics - Introduction to Power Electronics
      Power Electronics - Introduction to Power Electronics
  Module 3
    Module 3 Introduction
    Class Demo - Doubly Fed Induction Generators
      Class Demo - Doubly Fed Induction Generators
    Doubly-Fed Induction Generator (DFIG) Demo
      Doubly-Fed Induction Generator (DFIG) Demo
  Module 4
    Module 4 Introduction
  Module 5
    Module 5 Introduction
  Module 6
    Module 6 Introduction
  Midterm
    Midterm Introduction
  Module 7
    Module 7 Introduction
    Slip ring and brush explaination
      Slip ring and brush explaination
    Slip Ring and Brushes
      Slip Ring and Brushes
  Module 8
    Module 8 Introduction
    M8-Connections for a 230 460v delta ind motor practice.pdf
    M8-Connections for a 230 460v wye ind motor practice.pdf
    M8-Connections for High and Low Voltage 3 phase ind motors.pdf
  Finals
    Finals Introduction