Title: Unit 14 Test Unit-10
Course: HAC 140 Weatherization > Section: HAC 140 Weatherization

Q: In which of the following situations should weatherization services be deferred?
- Illegal activities are going on
- The client refuses certain measures
- Animals are threatening weatherization staff
- All of the above
A: All of the above

Q: When wrapping up your work day, you should do which of the following?
- Leave the tools in the area you will need to use them on the next day
- Leave spilled insulation for the homeowner to clean up
- Debrief with your crew
- Leave protective barriers in place
A: Debrief with your crew

Q: Which of the following is not considered a pre-exiting condition?
- Unchained animals
- Electrical hazards
- Unvented exhaust fans
- Moisture issues
A: Unchained animals

Q: According to OSHA’s definition, a confined space:
- Is large enough for an employee to enter fully and perform assigned work
- Is not designed for continuous occupancy by the employee
- Has a limited or restricted means of entry or exit
- All of the above
A: All of the above

Q: Auditors should note which of the following?
- Knob and tube wiring
- Open wire splices
- Uncovered junction boxes
- All of the above
A: All of the above

Q: For lead-safe work, you should cover the ground with plastic sheeting material extending 10 feet beyond the perimeter of surfaces undergoing renovation.
- True
- False
A: True

Q: For lead-safe work, you should close doors and windows within 300 feet of the work area.
- True
- False
A: False

Q: Lead-safe weatherization is required on all weatherization jobs on homes built prior to 1978.
- True
- False
A: True

Q: Weatherization is a very invasive process, so you should try to put your client at ease by keeping them informed of what will be done.
- True
- False
A: True

Q: Before you get started with your work, you should do a quick walk-through to determine if there are any pre-existing conditions to be noted.
- True
- False
A: True

Q: Mold on walls is not an issue for weatherization technicians.
- True
- False
A: False

Q: All ventilation exhaust fans must be vented through the roof with smooth metal pipe.
- True
- False
A: True

Q: The crew chief is usually the first weatherization worker to visit the home and decide if it will be deferred or weatherized.
- True
- False
A: False

Q: Even if a dwelling was weatherized with DOE funds after 1994, it may still be re-weatherized with DOE funds.
- True
- False
A: False

Q: DOE funds may be spent to weatherize condemned homes.
- True
- False
A: False