Title: Reading
Course: HAC 140 Weatherization > Section: HAC 140 Weatherization

Reading

Reading Assignment

Read the following documents to help you prepare for this course:

Read the Windows and Doors document.
Read the Identifying and Air-Sealing the Building Envelope document.
Read the Guide to Air Sealing document.
Read the Building Technologies Program Air Leakage Guide document.
Read the BTP Air Sealing Guide document.
Read the Air Sealing document.

Click on the item below to download Windows and Doors document
- Windows and Doors.pdf (3.46 MB)

Click on the item below to download Identifying and Air-Sealing document
- Identifying and Air Sealing the Building Envelope.pdf (5.53 MB)

Click on the item below to download Guide to Air Sealing document
- Guide to Air Sealing.pdf (942.75 KB)

Click on the item below to download Building Technologies Program Air document
- Building Technologies Program Air Leakage Guide.pdf (3.44 MB)

Click on the item below to download BTP Air Sealing Guide document
- BTP Air Sealing Guide.pdf (5.09 MB)

Click on the item below to download Air Sealing document
- Air Sealing.pdf (232.84 KB)