Title: Unit 14 Glossary
Course: HAC 140 Weatherization > Section: HAC 140 Weatherization

Unit 14 Glossary

Terms

Term | Definitions
Corrective action | Typically used in reference to deferral of services, the action a prospective client must take to allow weatherization work to proceed on the home. Having a roof repaired and removing a threatenin ...
Deferral of services | Postponement or denial of weatherization services to the client.
Double-insulated tool | Double-insulated tools help protect against electrical shock and have an outer casing of plastic or some other non-conductive material.
Foot candle | A measure of light striking a surface.
High-efficiency particulate air (HEPA) vacuum | HEPA vacuum means a vacuum cleaner which has been designed with a high-efficiency particulate air (HEPA) filter as the last filtration stage. A HEPA filter is a filter that is capable of capturing ...
Knob and tube wiring | Early standardized method for electrical wiring in homes consisting of insulated copper conductors supported by porcelain knobs (along their lengths) and tubes (when passing through framing member ...
Mold | A growth of minute fungi forming on vegetable or animal matter and associated with decay or dampness.
Personal fall arrest system | A system used to arrest an employee in a fall from a working level. It consists of an anchor point, connectors, a body belt or body harness and may include a lanyard, deceleration device, lifeline ...
Personal protective equipment (PPE) | Accessories such as safety glasses, ear plugs, and respirators worn to protect individuals from workplace hazards.
Subgrantee | A person or agency that is awarded a sub-grant and is accountable to the grantee for the utilization of resources.
Tack pads | Large, sticky pads that help remove dust from shoes, etc...