Title: Unit 6 Quiz
Course: ELT 260 Introduction to Hydropower > Section: ELT 260 Introduction to Hydropower

Q: Select from the following answers the correct answer to the question.

The International System of Units is Abbreviated as ____________
- IS
- ISU
- SIU
- SI
A: SI

Q: Select from the following answers the correct answer to the question.

Engineering notation prefix always corresponds to a prefix only with exponents that are multiples of _____.
- 9
- 3
- 6
- 2
A: 3

Q: Select from the following answers the correct answer to the question.

To write 6600000 in Engineering Notation it would equal ________.
- 66M
- 6M
- 660M
- 6.6M
A: 6.6M

Q: Select from the following answers the correct answer to the question.

To write 0.000143 in Engineering Notation it would equal _________.
- 143µ
- 1.43µ
- 14.3µ
- .143µ
A: 143µ

Q: Select from the following answers the correct answer to the question.

Watt’s Law describes the electrical power in watts produced by an electrical circuit.
- True
- False
A: True

Q: Select from the following answers the correct answer to the question.

An electrical circuit is a path that allows current to flow.
- True
- False
A: True

Q: Select from the following answers the correct answer to the question.

The parts of an electrical circuit are _____________________.
- Source, Control, Path, Switch
- Generator, Switch, Load, Motor
- Generator, Switch, Path, Lamp
A: Generator, Switch, Path, Lamp

Q: Select from the following answers the correct answer to the question.

Sources of electricity may only be produced from renewable energy sources.
- True
- False
A: False

Q: Select from the following answers the correct answer to the question.

A source for a circuit may be a ___________.
- Hydropower plant
- Solar Voltaic Panel
- Wind Turbine
- All of the Above
A: All of the Above

Q: True/False:  Please select the appropriate choice for the following statement.

If you know two of the three Quantities in Watt’s Law you cannot find the third.
- True
- False
A: False