Title: Assignment
Course: ELT 260 Introduction to Hydropower > Section: ELT 260 Introduction to Hydropower

Assignment

Engineering Notation Worksheet

Read the Activity #4 (IWA-4) Power Transmission of Electric Light Using Parallel and Series Circuits information sheet before coming to the lab, and then study the diagram of the MEGATECH Trainer components and controls.

Complete the Engineering notation worksheet.

Once you have completed the assignment go to the Dropbox Folder in the Content Menu and click on "Dropbox: Unit 6 Engineering Notation Worksheet” to learn how to submit the assignment.
Click on the item below to download Engineering Notation Workshop Sheet
- Engineering Notation workshop sheet revised 9-29-13.docx (25.67 KB)

Click on the item below to download the Metric Prefixes Table
- Metric Prefixes Table 11-10-12.docx (14.25 KB)