Title: Unit 1 Quiz
Course: WTEC 101 Intro to Wind Energy > Section: WTEC 101 Intro to Wind Energy

Q: Please choose if the statement is true or false about harness inspection.

Most Manufacturer’s of mech. F.A. Equip. (SRLs) don’t require them to be inspected annually by a competent person if inspected daily by the user.
- True
- False
A: False

Q: Please choose if the statement is true or false about harness inspection.

Five or fewer ripped stitches on a F.B.H. is acceptable (can be used for F.P.).
- True
- False
A: False

Q: Please choose if the statement is true or false about harness inspection.

Shock Absorbing lanyards can be used if deployed eight (8) inches or less.
- True
- False
A: False

Q: Please choose if the statement is true or false about harness inspection.

Burns show up on webbing as a hole or hard brownish area.
- True
- False
A: True

Q: Please choose if the statement is true or false about harness inspection.

Ripped stitches can be repaired by the end user.
- True
- False
A: False