Course: MTEC 263 General Hydraulics

Lab Activity: Electrical Controls

Electrical Controls

In many other industries, including most local manufacturing and power generating applications, electrical or electronic controls are preferred because of the many advantages typical of electrical devices.  These advantages include remote operation, programmability, quiet operation, speed, and reliability.  Electrically controlled fluid power valves are operated with solenoids connected to push buttons, relays, programmable logic controllers and other microprocessor based control devices.
Click item below to download Lab Activity 8.1 Electrical Controls Assignment
- Hyd_lab 8-1 Electrical Controls 5_6.docx (74.79 KB)