Title: Module 3 Worksheets
Course: PTN 0086 Pharmacy Technician III > Section: Module 3: Prepare Intravenous Admixtures (Part 2 of 2)

Chapter worksheets give you an opportunity to practice and review the concepts presented in the reading. You do not have to submit these worksheets, but it is highly recommended that you complete them. This activity is ungraded. Complete the following worksheets in your workbook:

American Pharmacists Association. (2013). The pharmacy technician workbook & certification review (5th ed.). Englewood CO: Morton Publishing.

Chapter 9 Workbook Pages