Title: Lab Practical Exam (In lab)
Course: PHT 1200C Basic Patient Care > Section: Module 12

Students are required to take a Lab Practical Exam. This exam is worth 100 points. The exam will cover activities and interventions covered in the laboratory portion of the course.

Any student that does not successfully pass the lab practical exam on the first attempt will be provided with one additional attempt. Scoring on the second attempt will be the same as the first attempt, but the best score the student can achieve is a 75%. Failure of the practical exam will result in failure of the course, regardless of overall course grade.