Title: Finals Week
Course: PHT 1200C Basic Patient Care > Section: Module 12

Introduction

Welcome to Finals Week! As part of this module, you will be completing 2 exams. The first exam will be a written Final Exam. This exam is cumulative and will assess your knowledge of all of the content covered within this course. You should prepare by reviewing all of the previous modules. You may want to use your previous quizzes as a tool for preparing for the final exam.

The second exam is the lab practical. You will need to sign up in a time slot to complete the practical. Please see the sign up sheet, provided by the instructor to secure your slot. This exam will assess your knowledge of and ability to apply any of the interventions that you have learned in the lab portion of this class. You should refer to the Lab Skill/Competency Check Off forms as a guide for expected behaviors and skills. You should be prepared to perform and and all of the check off items during the lab practical.

If you have any questions related to either exam, please feel free to speak with your instructor.

Assignments

- Submit Final Exam
- Complete Lab Practical Exam