Title: Physical Assessment Video
Course: NUR 1008C Transition to Prof Nursing > Section: Module 4

The students will perform a complete head to toe assessment by a physical assessment video following the rubric. Read the guidelines in the document above and the information in the syllabus for more information. The video should be no longer than 30 minutes of assessment and 15 minutes of documentation. The video is due in Module Seven and should be sent via United States Postal Mail as a DVD or uploaded to a video service identified by the instructor. The upload link is in Module Seven.

Attachments

- Physical_Assessment_Video_Guidelines.docx
- DocumentationRubricModule 4.docx
- AssessmentVideoRubricModule4.docx