Title: Module 12 Discussion - Oral Appliances
Course: DES 1100 Dental Materials > Section: Module 12 - Oral Appliances

After reading oral appliances in your textbook and conducting your own research on the maintenance of various oral appliances, prepare a script or dialogue that may be used for patient education regarding oral appliances, be sure to describe the proper maintenance of oral appliances. When replying to your classmates’ posts, ask two questions that a patient may have after receiving that particular information.