Title: home page
Course: DES 1100 Dental Materials

[ Click here for Course Announcements ]

CLICK HERE TO DOWNLOAD THE COURSE SYLLABUS IN PDF FORMAT.
This document also contains information about course requirements, materials/textbook and a detailed schedule of all course requirements, assignments, and tests/exams.

SYLLABUS INTRODUCTION
Click the link above to learn more about your syllabus and instructor for this course.

LEARNING MODULES
Click the link above to find the course modules, including links to all content and graded work necessary to complete the module (assignments, assessments, discussions, projects, etc).

TEXTBOOK INFORMATION

- Title:
- Other: Online access, technology devices, etc.

You must review the entire course syllabus for detailed information about the course requirements. The list below is a high-level overview of the items you will be graded on during the semester.