Title: Module 1 Reflective Assignment
Course: DES 1100 Dental Materials > Section: Module 1 - Introduction to Dental Materials

Summarize the reasons why a dental hygienist should be knowledgeable in the science of dental materials particularly in the delivery of dental care.

Compose your work using a word processor (or other software as appropriate) and save it frequently to your computer. Be sure to check your work and correct any spelling or grammatical errors before you submit it.