Title: Oral Appliances
Course: DES 1100 Dental Materials > Section: Module 12 - Oral Appliances

Introduction

In this module, the various types of oral appliances will be introduced. Appliances used to break habits such as thumb sucking, appliances used to protect the teeth during sports, and appliances used to hold therapeutic products against the teeth for extended periods of time will be covered. Techniques used to fabricate these oral appliances along with how to properly care for and maintain these appliances will be presented.

Oral appliances are common in dentistry and dental hygienists should be knowledgeable of the various types. An understanding of these appliances will allow the dental hygienist to educate patients on proper care and maintenance of these appliances. In many states dental hygienists are permitted to be involved in the fabrication of oral appliances.

Objectives

Upon completion of this module, the student will be able to:

- Describe the proper maintenance of oral appliances.
- Prepare a script or dialogue that may be used for patient education regarding oral appliances.
- Explain the steps involved in fabricating an oral appliance.

Readings & Resources

Clinical Aspects of Dental Materials, Marcia Stewart and Michael Bagby, Chapter 18, pp.234-242.

Assignments and Activities

- Post in the Module 12 Discussion Board.
- Complete the Module 12 Additional Resources Assignment.
- Complete the Final Exam.