Title: Module 1 Quiz
Course: CAP 2140 Digital Forensics > Section: Computer Forensics and Investigations as a Profession

Q: Most computer investigations in the private sector involve ____.
- e-mail abuse
- misuse of computing assets
- Internet abuse
- VPN abuse
A: misuse of computing assets

Q: In addition to warning banners that state a company’s rights of computer ownership, businesses should specify a(n) ____ who has the power to conduct investigations.
- authorized requester
- authority of line
- line of right
- authority of right
A: authorized requester

Q: Have you read the syllabus completely and thoroughly?
- Yes
- No
A: Yes

Q: Without a warning banner, employees might have an assumed ____ when using a company’s computer systems and network accesses.
- line of authority
- right of privacy
- line of privacy
- line of right
A: right of privacy

Q: Do you accept all the items in the syllabus?
- Yes
- No
A: Yes

Q: A(n) ____ is a person using a computer to perform routine tasks other than systems administration.
- complainant
- user banner
- end user
- investigator
A: end user

Q: A ____ usually appears when a computer starts or connects to the company intranet, network, or virtual private network (VPN) and informs end users that the organization reserves the right to inspect computer systems and network traffic at will.
- warning banner
- right of privacy
- line of authority
- right banner
A: warning banner

Q: Published company policies provide a(n) ____ for a business to conduct internal investigations.
- litigation path
- allegation resource
- line of allegation
- line of authority
A: line of authority

Q: The affidavit must be ____ under sworn oath to verify that the information in the affidavit is true.
- notarized
- examined
- recorded
- challenged
A: notarized

Q: It’s the investigator’s responsibility to write the affidavit, which must include ____ (evidence) that support the allegation to justify the warrant.
- litigation
- prosecution
- exhibits
- reports
A: exhibits

Q: The ____________________ provides a record of clues to crimes that have been committed previously.
A: police blotter

Q: When you work in the ____________________ group, you test and verify the integrity of standalone workstations and network servers.
A: vulnerability assessment and risk management

Q: The term ____________________ refers to large corporate computing systems that might include disparate or formerly independent systems.
A: enterprise network environment

Q: The ____________________ to the U.S. Constitution (and each state’s constitution) protects everyone’s rights to be secure in their person, residence, and property from search and seizure.
A: Fourth Amendment

Q: ____________________ involves obtaining and analyzing digital information for use as evidence in civil, criminal, or administrative cases.
A: Computer forensics

Q: The law of search and seizure protects the rights of all people, excluding people suspected of crimes.
- true
- false
A: false

Q: After a judge approves and signs a search warrant, it’s ready to be executed, meaning you can collect evidence as defined by the warrant.
- true
- false
A: true

Q: By the 1970s, electronic crimes were increasing, especially in the financial sector.
- true
- false
A: true

Q: What are some of the most common types of corporate computer crime?

Q: What are some of the most common types of corporate computer crime?