Title: CAP 2140 Digital Forensics

Startup Information
  Questions for the Professor
  Cyber Café
  Student Contract
  Student Contract
  Course Calendar
Tools & Resources
  Career Advising and Job Placement
  Canvas Help
  Writing Resources
  Library and Learning Commons
  Study Skills and Survival Tips
  Study Skills and Survival Tips
  Netiquette (Online Manners)
  Edison State College - Student Information Station
Computer Forensics and Investigations as a Profession
  Computer Forensics and Investigations as a Profession
  Forensics Lab: Installations
  Discussion 1
  Module 1 Quiz
Understanding Computer Investigations
  Understanding Computer Investigations
  Forensics Lab: Images
  Discussion 2
  Module 2 Quiz
The Investigator’s Office and Laboratory
  The Investigator’s Office and Laboratory
  Forensics Lab: Laboratory
  Discussion 3
  Module 3 Quiz
Data Acquisition
  Data Acquisition
  Forensics Lab: Data
  Discussion 4
  Module 4 Quiz
Processing Crime and Incident Scenes
  Processing Crime and Incident Scenes
  Forensics Lab: Processing
  Discussion 5
  Module 5 Quiz
Working with Windows and DOS Systems
  Working with Windows and DOS Systems
  Forensics Lab: Windows
  Discussion 6
  Module 6 Quiz
Current Computer Forensics Tools
  Current Computer Forensics Tools
  Forensics Lab: Tools
  Discussion 7
  Module 7 Quiz
Macintosh and Linux Boot Processes and File Systems
  Macintosh and Linux Boot Processes and File Systems
  Forensics Final Lab: Alternates
  Discussion 8
  Module 8 Quiz
  Final Exam
FRC-TEC Surveys
  Student Survey - Midterm
  Faculty Survey - Midterm
  Student Survey - Final
  Faculty Survey - Final
Instructor Resources
  FOR INSTRUCTOR USE ONLY
  Course Syllabus
  Tutorial | Updating and Uploading your Syllabus (DRAFT)
  Student & Faculty Surveys for FRC-TEC