Title: Module 10 Discussion
Course: DEH 2530 Expanded Duties > Section: Module 10 - Orthodontic Appliances

Orthodontic patients present some unique challenges to the dental hygienist. Discuss a challenge associated with patients in active orthodontic therapy and how you would overcome it.