Title: Module 9 Quiz
Course: DEH 2530 Expanded Duties > Section: Module 9 - Suture Removal

Q: Elevating the knot with cotton pliers assists in preventing accidental trauma to the surgical site during suture removal
- True
- False
A: True

Q: How long after nonabsorbable sutures are placed are they generally removed?
- 2-5 days
- 5-7 days
- 1-2 weeks
- 2-3 weeks
A: 5-7 days

Q: Proper documentation of suture removal should include which of the following?
- How tissue is healing
- Number of sutures removed
- Any complications
- All of the above
A: All of the above

Q: Which of the following instruments is not on a tray setup for suture removal?
- Suture scissors
- Hemostat
- Cotton pliers
- Mirror
A: Hemostat

Q: Which of the following is not a benefit of using suture after surgery?
- Reduces chance of infection
- Promotes healing
- Controls bleeding
- All of the above
A: All of the above