Title: Module 8 Quiz
Course: DEH 2530 Expanded Duties > Section: Module 8 - Periodontal Dressing

Q: For dressing removal, what instrument is used to gently pry the dressing away from the healing periodontal tissue
- Explorer
- Cotton pliers
- Spoon excavator
- Carver
A: Spoon excavator

Q: Small wedges of dressing material are placed interproximmaly at the surgical site to bond the facial and lingual strips of dressing
- True
- False
A: True

Q: What is used to mix zinc oxide-eugenol periodontal dressing on a paper pad?
- Cement spatula
- Tongue depressor
- It comes pre-mixed and ready to use.
- None of the above
A: Tongue depressor

Q: Which error in technique causes irritation of the mucobuccal fold by a periodonatl dressing?
- Overextension of dressing
- Overmixing of dressing
- Inadequate quantity of dressing
- All of the above
A: Overextension of dressing

Q: Why is a periodontal dressing placed after periodontal surgery?
- To serve as a bandage over the surgical site
- To minimize postoperative pain, infection, and hemorrhage
- To support mobile teeth during the healing process
- All of the above
A: All of the above