Title: Lab 15
Course: CTS 2346 Windows Server 2012 > Section: Module 5

Directions: The following exercises can be performed either in a computer lab or on a virtual machine. The detailed instructions for these exercises and the lab worksheets are in the 70-411 Lab Manual published by John Wiley & Sons. You should complete the lab worksheet, save it as a document (YourName_LabX.docx) and submit it to the drop box for this assignment. For information on grading, see the attached rubric.

Exercise 15.1 Creating a Service Account

Exercise 15.2 Creating a Managed Service Account

Exercise 15.3 Configuring Kerberos and Kerberos Delegation