Title: Course Calendar
Course: CTS1133 Software Configuration > Section: Startup Information

This is your schedule of what's due and when. This calendar can be printed by right-clicking on the calendar and choosing "This frame" and then choosing "Print frame."

Week | Topic(s) | Assigned Work | Points Possible | Due Date
XXXX-XXXX | Module 1: Installing Windows | Student Contract | 0 |
Greetings and Introductions | 0 |
Discussion 1 | 20 |
Virtual Lab Assignment 1 | 50 |
Quiz 1 | 40 |
XXXX-XXXX | Module 2: Maintaining & Optimizing Windows | Discussion 2 | 20 |
Virtual Lab Assignment 2 | 50 |
Quiz 2 | 40 |
XXXX-XXXX | Module 3: Troubleshooting Windows & Applications | Discussion 3 | 20 |
Virtual Lab Assignment 3 | 50 |
Quiz 3 | 40 |
XXXX-XXXX | Module 4: Troubleshooting Windows Startup Problems | Discussion 4 | 20 |
Virtual Lab Assignment 4 | 50 |
Quiz 4 | 40 |
XXXX-XXXX | Module 5: Windows Networking | Discussion 5 | 20 |
Virtual Lab Assignment 5 | 50 |
Quiz 5 | 40 |
XXXX-XXXX | Module 6: Connecting to Resources on a Network | Discussion 6 | 20 |
Virtual Lab Assignment 6 | 50 |
Quiz 6 | 40 |
XXXX-XXXX | Module 7: Windows Security | Discussion 7 | 20 |
Virtual Lab Assignment 7 | 50 |
Quiz 7 | 40 |
XXXX-XXXX | Module 8: Mobile Device Support & Virtualization | Discussion 8 | 20 |
Virtual Lab Assignment 8 | 50 |
Quiz 8 | 40 |
Final Exam | 120 |
Optional Practice for Certification | 0 |
Total Points | 1000 |