Title: Course Calendar
Course: DEH 1720 Dental Hygiene Course

This is your schedule of what's due and when. This calendar can be printed by right-clicking on the calendar and choosing "This frame" and then choosing "Print frame."

Week | Topic(s) | Readings/Resources | Assigned Work | Points Possible | Due Date
XXXX-XXXX | Module 1: Introduction to Primary Preventive Dentistry | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 1, pgs 1-12 | Student Contract | 2.5 |
Greetings and Introductions | 2.5 |
Module 1 Discussion | 15 |
Module 1 Reflective Assignment | 15 |
XXXX-XXXX | Module 2: Dental Plaque Biofilm | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 4, pgs 39-54 | Module 2 Discussion | 15 |
Module 2 Reflective Assignment | 15 |
Module 2 Quiz | 20 |
XXXX-XXXX | Module 3: Carious Lesions | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 5, pgs 53-68 | Module 3 Slide Presentation | 50 |
Module 3 Reflective Assignment | 15 |
Module 3 Quiz | 20 |
XXXX-XXXX | Module 4: Toothbrushes and Tooth Brushing Methods | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 10, pgs 134-146 | Module 4 Discussion | 15 |
Module 4 Video Presentation | 50 |
Module 4 Reflective Assignment | 15 |
XXXX-XXXX | Module 5: Dentifrices, Mouth Rinses, and Chewing Gums | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 11, pgs 146-162 | Module 5 Discussion | 15 |
Module 5 Reflective Assignment | 15 |
Module 5 Quiz | 20 |
XXXX-XXXX | Module 6: Dental Product Advertisements | Dental Public Health & Research. Nathe. 3^rd ed. Chapter 19, pgs 289-293 | Module 6 Discussion | 15 |
Module 6 Critique of Dental Product Advertisement | 100 |
XXXX-XXXX | Module 7: Self-Care Adjuncts Implant and Denture Self-Care | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapters 12 and 13, pgs 163-221 | Module 7 Discussion | 15 |
Module 7 Video Presentation | 50 |
Module 7 Reflective Assignment | 15 |
XXXX-XXXX | Module 8: Health Education and Promotion Theories | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 19, pgs 324-338 | Module 8 Discussion | 15 |
Module 8 Reflective Assignment | 15 |
Module 8 Quiz | 20 |
XXXX-XXXX | Module 9: Nutrition, Diet, and Associated Oral Conditions/ Sugar and Other Sweeteners | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapters 17 and 18, pgs 286-323 | Module 9 Discussion | 15 |
Module 9 Reflective Assignment | 15 |
Module 9 Quiz | 20 |
XXXX-XXXX | Module 10: Topical Fluoride Therapy | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 15, pgs 248-272 | Module 10 Discussion | 15 |
Module 10 Reflective Assignment | 15 |
Module 10 Quiz | 20 |
XXXX-XXXX | Module 11: Dental Trauma | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 8, pgs 112-121 | Module 11 Reflective Assignment | 15 |
Module 11 Quiz | 20 |
XXXX-XXXX | Module 12: Tobacco Cessation | Primary Preventive Dentistry, Harris, Godoy, and Nathe, Chapter 20, pgs 339-360. http://www.aheceducation.com | Module 12 Discussion | 15 |
Module 12 Certificate of Completion for Tobacco Modules (4 @10pts each) | 40 |
Module 12 Slide Presentation | 50 |
Module 12 Reflective Assignment | 15 |
Final Exam | 200 |
 | Total Points | 1000 |