Title: Intermediate Coding and Classification Systems

Startup Information
  Questions for the Professor
  Cyber Café
  Student Contract
  Student Contract
  Course Calendar
Tools & Resources
  Career Advising and Job Placement
  Canvas Help
  Writing Resources
  Library and Learning Commons
  Study Skills and Survival Tips
  Study Skills and Survival Tips
  Netiquette (Online Manners)
  Edison State College - Student Information Station
Syllabus
  Choose this link to access the Course Syllabus
  Syllabus Introduction
  DShumway_Intermediate Coding Course SyllabusNew.pdf
Module 1: Introduction to Intermediate Classifications and Codings
  Introduction to Intermediate Coding and Classification Systems
  Module 1 Discussion: How Will You Study?
  Module 1: ICD 9 and ICD-10
Module 2: Alphabetic Index, Tables, List of Codes
  Alphabetic Index, Tables, and List of Codes
  Module 2 Discussion: Coding
  Module 2: Chapters 9, 10, and 11
Module 3: Root Operations Part 1
  Root Operations Part 1
  Module 3 Discussion: 3 More Root Operations
  Module 3 Discussion: 3 More Root Operations
  Module 3 Assignment: Anatomy Review
  Module 3:Textbook: ICD-10-PCS: An Applied Approach
Module 4: Root Operations Part 2
  Root Operations Part 2
  Module 4 Discussion: More Root Operations
  Module 4: Root Operations Continued
Module 5: Examination, Other Repairs, Other Objectives
  Examination, Other Repairs, Other Operations
  Module 5 Discussion: Examination, Other Repairs
  Module 5: Chapter Test
Module 6: The Nervous System and Sense Organs
  The Nervous System and Sense Organs
  Module 6 Discussion: Three Anatomical Body Systems
  Module 6: Test
Module 7: The Respiratory and Circulatory Systems
  The Respiratory and Circulatory Systems
  Module 7 Discussion: Applicable Approaches
  Module 7: Chapters 10 and 11
Module 8: The Gastrointestinal and Hepatobiliary Systems
  The Gastrointestinal and Hepatobiliary Systems
  Module 8 Discussion: The Nervous System
  Module 8: Test
Module 9: The Integumentary and Muscular Systems
  The Integumentary and Muscular Systems
  Module 9 Discussion: Coding Guidelines
  Module 9: Test
Module 10: The Skeletal and Urinary Systems
  The Skeletal and Urinary Systems
  Module 10 Discussion: The Skeletal System
  Module 10 Assignment: The Skeletal System
  Module 10: Skeletal and Urinary System Test
Module 11: Male and Female Reproductory Systems
  The Male and Female Reproductory Systems
  Module 11 Discussion: Female Reproductive System
  Module 11: Reproductory System Test
Module 12: Obstetrics, Placement, Administration, Measurement, Monitoring
  Obstetrics, Placement, Administration, Measurement, Monitoring
  Module 12 Discussion: Abortion and Delivery
  Module 12: Obstetrics Test
Module 13: Extracorporeal Assistance, Performance, and Therapies
  Extracorporeal Assistance, Performance, and Therapies
  Module 13 Discussion: Extracorporeal Assistance
  Module 13: Extracorporeal Assistance Test
Module 14: Imaging, Nuclear Medicine and Radiation Oncology
  Imaging, Nuclear Medicine and Radiation Oncology
  Module 14 Discussion: Root Types for Imaging
  Module 14: Imaging, Nuclear Medicine Test
Module 15: Exercises and Case Studies
  Exercises and Case Studies
  Module 15 Discussion: Substance Abuse Root Types
  Exercises (30) Questions
  Case Studies
Instructor Resources
  Course Syllabus
  Curriculum Map
  Instructor Guidelines HIM2284.docx
  Tutorial | Updating and Uploading your Syllabus (DRAFT)
  Faculty Survey - Midterm
  Faculty Survey - Final
  Student & Faculty Surveys for FRC-TEC
  Course Review Form FRC-TEC.docx
FRC-TEC Surveys
  Student Survey - Midterm
  Student Survey - Final