Title: Module 12: Obstetrics Test
Course: Intermediate Coding and Classification Systems > Section: Module 12: Obstetrics, Placement, Administration, Measurement, Monitoring

Q: Cesarean deliveries are coded to the root operation:
- Excision
- Extraction
- Delivery
- Removal
A: Extraction

Q: When a woman has a baby vaginally and no instrumentation or incision is needed, the root operation assigned is:
- Excision
- Extraction
- Delivery
- Removal
A: Delivery

Q: When a woman has a baby vaginally and an incision or instrumentation is required, such as forceps or internal version, the root operation assigned is:
- Excision
- Extraction
- Delivery
- Removal
A: Extraction

Q: When twins are delivered by C-section and one twin is delivered using low forceps and the other is delivered using internal version,:
- two codes are assigned using the root operation Extraction with 2 different qualifiers
- one code is assigned using the root operation of Extraction
- one code is assigned using the root operation of Delivery
- two codes are assigned using the root operation of Delivery with 2 different qualifiers
A: two codes are assigned using the root operation Extraction with 2 different qualifiers

Q: During the In Vitro fertilization process, when the eggs are extracted from the ovary, this is coded using the root operation of _____________ with the body part of _________.
- Removal, ovary
- Extraction, ova
- Extraction, ovary
- Removal, ova
A: Extraction, ova

Q: During the In Vitro fertilization process, when the eggs are fertilized outside the body, this is coded in the Other Procedures section using the root operation of:
- In vitro fertilization
- Placement
- Extraction
- Other procedures
A: Other procedures

Q: During the In Vitro fertilization process, when the fertilized eggs are implanted inside the body, this is coded in the Administration section using the root operation of:
- Introduction
- Insertion
- Placement
- Implantation
A: Introduction

Q: This forceps delivery is performed when the baby's head is not engaged and this type of forceps delivery is not recommended.
- low forceps
- mid forceps
- high forceps
- rotation forceps
A: high forceps

Q: The approach to be assigned for Cesarean Section procedures is:
- open
- percutaneous endoscopic
- percutaneous
- via natural or artificial opening
A: open

Q: The approach to be typically assigned for Amniocentesis is:
- open
- percutaneous endoscopic
- percutaneous
- via natural or artificial opening
A: percutaneous

Q: The root operation(s) that means, "taking out or off a device from a body region and putting back an identical or similar device in or on the same body region without cutting or puncturing the skin or a mucous membrane" is:
- Removal
- Removal and Change
- Change
- Insertion
A: Change

Q: The root operation that means, "exerting a pulling force on a body region in a distal direction" is:
- Compression
- Traction
- Immobilization
- Removal
A: Traction

Q: The root operation which means, "putting material on a body region for protection" is:
- Dressing
- Packing
- Immobilization
- Change
A: Dressing

Q: When a patient has stockings on to increase circulation, the root operation is:
- Packing
- Dressing
- Immobilization
- Compression
A: Compression

Q: When a patient has a cast placed on a sprained wrist, the root operation assigned is:
- Immobilization
- Reduction
- Placement
- Administration
A: Immobilization

Q: When a patient has an injection of a steroid, the root operation assigned is:
- Transfusion
- Irrigation
- Introduction
- Injection
A: Introduction

Q: This root operation is defined as, "determining the level of a physiological or physical function at a point in time".
- Measurement
- Monitoring
- Capacity
- Examine
A: Measurement

Q: When an EKG is performed to determine the cardiac electrical activity, the root operation assigned is:
- Measurement
- Examination
- Monitoring
- Other procedures
A: Measurement

Q: This root operation is a term that describes a single level taken, such as a single temperature reading.
- Monitoring
- Measurement
- Examination
- Single organ examination
A: Measurement

Q: This root operation is a term describes a series of levels obtained at intervals, such as temperature taken every half hour for 8 hours.
- Monitoring
- Measurement
- Examination
- Multi-system examination
A: Monitoring