Title: Module 14: Imaging, Nuclear Medicine Test
Course: Intermediate Coding and Classification Systems > Section: Module 14: Imaging, Nuclear Medicine and Radiation Oncology

Q: This root type is used in the Imaging Section and involves a computer reformatted digital display of multi-planar images developed from the capture of radio-frequency signals emitted by nuclei in a body site excited within a magnetic field.
- Ultrasonography
- Plain radiography
- Computerized Tomography (CT Scan)
- Magnetic Resonance Imaging (MRI)
A: Magnetic Resonance Imaging (MRI)

Q: The root type assigned for bone x-rays is:
- Plain radiography
- CT Scan
- Fluoroscopy
- Ultrasonography
A: Plain radiography

Q: The root type assigned for a mammography is:
- Plain radiography
- Magnetic Resonance Imaging
- Fluoroscopy
- Ultrasonography
A: Plain radiography

Q: The root type used in the Nuclear Medicine Section which involves the introduction of
radioactive materials into the body for measurements of organ function, from the detection of radioactive emissions.
- Nonimaging Nuclear Medicine Uptake
- Nonimaging Nuclear Medicine Probe
- Nonimaging Nuclear Medicine Assay
- Nonimaging Nuclear Medicine Emission
A: Nonimaging Nuclear Medicine Uptake

Q: Planar nuclear medicine imaging is also referred to as:
- 3-D scan
- PET scan
- scintigraphy
- ultrasound
A: scintigraphy

Q: SPECT (Single Photon Emission Computed Tomography) is an example of:
- Tomographic Nuclear Medicine Imaging
- Positron Emission Tomography (PET)
- Systemic Nuclear Medicine Therapy
- Planar Nuclear Medicine Imaging
A: Tomographic Nuclear Medicine Imaging

Q: The 6th and 7th character qualifier values for the Nuclear Medicine section are always:
- X - Diagnostic
- 0 - Intraoperative
- Z - No qualifier
- Y - Therapeutic
A: Z - No qualifier

Q: This modality is used in the Radiation Oncology Section and involves the practice of using a single treatment of high dose radiation on tumors with a volume less than 20 cm.
- Interstitial Brachytherapy
- Stereotactic Radiosurgery
- Brachytherapy
- Beam radiation
A: Stereotactic Radiosurgery

Q: The isotope values Cesium 137, Iridium 192, Iodine 125, Palladium 103, and Phosphorus 32 are used in the ________________________ Section.
- Imaging
- Radiation Oncology
- Nuclear Medicine
- Osteopathic
A: Radiation Oncology

Q: This modality is used in Radiation Oncology and delivers treatment at a close proximity, often internally with probes or Palladium seeds, such as to the prostate.
- Stereotastic Radiosurgery
- Brachytherapy
- Beam Radiation
- Teletherapy
A: Brachytherapy

Q: This root type is used in the Mental Health Section and provides information from the monitoring and regulating of physiological processes in conjunction with cognitive-behavioral techniques to improve patient functioning or well-being.
- Electroconvulsive Therapy
- Narcosynthesis
- Counseling
- Biofeedback
A: Biofeedback

Q: The application of controlled electrical voltages to treat a mental health disorder is called:
- Electroconvulsive therapy
- Psychophysiological therapy
- Crisis intervention
- Hypnosis
A: Electroconvulsive therapy

Q: The treatment of two or more individuals with a mental health disorder by behavioral, cognitive, psychoanalytic, psychodynamic, or psychophysiological means to improve functioning or well-being
- Individual psychotherapy
- Family psychotherapy
- Group psychotherapy
- Crisis intervention
A: Group psychotherapy

Q: The administration of intravenous barbiturates in order to release suppressed or repressed thoughts.
- Hypnosis
- Narcosynthesis
- Medication Management
- Crisis Intervention
A: Narcosynthesis

Q: This root type is used in the Physical Rehabilitation and Diagnostic Audiology Section and involves training in activities to support patient's optimal level of function.
- Caregiver training
- Activities of daily living treatment
- Motor and/or nerve function assessment
- Vestibular assessment
A: Caregiver training

Q: The measurement of hearing and related functions
- hearing monitoring
- hearing assessment
- hearing aid assessment
- hearing treatment
A: hearing assessment

Q: To code the fitting of a device, such as splints and braces, that apply only to the rehabilitation setting, assign a code in the _________________ section.
- Physical Rehabilitation and Diagnostic Audiology
- Placement
- Medical and Surgical
- Administration
A: Physical Rehabilitation and Diagnostic Audiology

Q: To code the fitting of a device, such as splints and braces, that apply only to inpatient settings, other than rehabilitation, assign a code in the _________________ section.
- Physical Rehabilitation and Diagnostic Audiology
- Placement
- Medical and Surgical
- Administration
A: Placement

Q: In the Mental Health Section, the third, fourth, and fifth character is always:
- O - Psychotherapy
- X - Therapy
- Y - Counseling
- Z - None
A: Z - None

Q: The "WAIS" is an acronym that is an example of a (an):
- Intellectual and psychoeducational test
- Personality test
- Behavioral test
- Neuropsychological test
A: Intellectual and psychoeducational test