Title: Variation in Binary Distillation Systems
Course: Open PRO240 Process Troubleshooting > Section: Module 4: Pump, Compressor & Heat Exchanger Systems

This is about a Control Study of a Binary Distillation Column

www.youtube.com/watch?v=z-X8YvpwFoI