Title: Troubleshooting Review Ch's 8, 9 & 10
Course: Open PRO240 Process Troubleshooting > Section: Module 4: Pump, Compressor & Heat Exchanger Systems

Action Required

Answer the review questions Chapter 8, Chapter 9, Chapter 10

at the end of the chapter in your textbook.

You may create in a word-processing document, and submit just one file with the answers to each chapter assigned within the module.