Title: Ch 13, 14 & 15 Slides for Review & Notetaking
Course: Open PRO240 Process Troubleshooting > Section: Module 6:Furnace. Hot Oil and Reactor Systems & Distillation

Action Required

- Review the Chapter 13 presentation
- Review the Chapter 14 presentation
- Review the Chapter 15 presentation

Throughout the course I will be posting the PowerPoints I will use to review the content you have studied throughout the module learning activities. Use these PowerPoints as an overview of what you will be learning throughout the module but do not print them because they are the full slides and will use up all of your ink and paper, see below to print an optimized version.

Optional

- Download & Print the PDF version of the Chapter 13 this link
- Download & Print the PDF version of Chapter 14  at this link
- Download & Print the PDF version of Chapter 15  at this link

these are the note-taking versions of my PowerPoint presentation that I made for you so that you can take notes while you listen without having to print out the full slides of the presentation.