Title: Separation & Extraction
Course: Open PRO240 Process Troubleshooting > Section: Module 7: Separator Systems & Troubleshooting Operations

Watch the four videos below:

Separation Techniques

www.youtube.com/watch?v=DqLKPmGyXbE

Liquid-liquid Extraction

www.youtube.com/watch?v=vcwfhDhLiQU

Theory of Extraction

www.youtube.com/watch?v=g4MkbzhI7cE

Liquid-liquid Extraction, Calculating Number of Extractions

www.youtube.com/watch?v=dgCzPWti6oY