Title: Percents
Course: Open PRO230 Quality in Process Technology

It takes 3 minutes to fill a 42 gallon barrel of crude oil. Question: What is the flow rate? Watch this demonstration of how to solve the rate problem above: | The air pressure at sea level is 147 pounds to 10 square inches. Question: What is the air pressure at sea level? Watch the demonstration below to find out how to solve this problem:
Determining Flow Rate brought to you by Livescribe | Determining Air Pressure brought to you by Livescribe