Title: Predictive Maintenance
Course: Open PRO220 Operations > Section: Module 4: Routine Technician Duties, Maintenance Duties: I & Maintenance Duties: II

A water utility cuts downtime with data
http://www.youtube.com/user/IBM/featured?v=H6mQHMc_il8