Title: Open PRO220 Operations

Relevant Course Information
  Course Goals & Objectives
  Required Textbook
  Learning Activities
Module 1: Getting Started, Process Technology Today, Safety I: Process Hazards & Safety II: The Permit System
  Module Overview-1
  Online Presentations
  Preview & NoteTaking
  Control Room Technician at Work
  Assignments
  Review Questions- Ch.1, 2, & 3
  Simtronics #1
  Assessment
  Reading & Understanding Quiz 1
Module 2: Quality as a Competitive Tool, Process Economics & Communication
  Module Overview-2
  Online Presentations
  Preview & NoteTaking 2
  Workplace Communication Skills
  Writing a Procedure
  Playscript Procedure & more...
  Assignments
  Review Questions- Chapters 4, 5, & 6
  Lab Report
  Assessment
  Reading & Understanding Quiz 2
Module 3: Process Physics, Process Samples & Significance of Common Laboratory Tests
  Module Overview-3
  Online Presentations
  Preview & NoteTaking 3
  Live Tank Oil Sampling
  Natural Gas and NGL Sampling
  Assignments
  Review Questions- Chapters 7, 8, & 9
  Simtronics #2
  Assessment
  Reading & Understanding Quiz 3
Module 4: Routine Technician Duties, Maintenance Duties: I & Maintenance Duties: II
  Module Overview-4
  Online Presentations
  Preview & NoteTaking 4
  Process Safety Management Training
  Simulation Training for Oil and Gas
  Predictive Maintenance
  Risk Management - Preventative Maintenance
  Assignments
  Review Questions Chapters- 10, 11, & 12
  Assessment
  Reading & Understanding Quiz 4
  Mid-Term Test
Module 5: Material Handling I: Bulk Liquids, Material Handling II: Bulk Solids & Material Handling III: Oil Movement and Storage
  Module Overview-5
  Online Presentations
  Preview & NoteTaking 5
  Water Treatment Process: Direct and Conventional Filtration
  Flocculants
  Wastewater Treatment
  Application of Refrigeration in Liquefied Natural Gas
  Assignments
  Review Questions Chapters- 13, 14, & 15
  Assessment
  Reading & Understanding Quiz 5
Module 6: Process Unit Shutdown, Process Unit Turnaround & Process Unit Startup
  Module Overview-6
  Online Presentations
  Preview & NoteTaking 6
  Lockout Tagout Safety Training
  Plant Commissioning & Startup Procedure
  NRU Start-Up
  Assignments
  Review Questions Chapters 16, 17, & 18
  Assessment
  Reading & Understanding Quiz 6
Module 7: Shut-Down & Culminating Activities
  Module Overview-7
  Online Presentations
  Preview & NoteTaking 7
  Emergency Situations
  Assignments
  Review Questions Chapters- 19 & 20
  Assessment
  Reading & Understanding Quiz 7
  Final Test