Title: Simulation Training for Oil and Gas
Course: Open PRO220 Operations > Section: Module 4: Routine Technician Duties, Maintenance Duties: I & Maintenance Duties: II

Watch this very short simulation:

www.youtube.com/watch?v=uO5-HLPXioU