Title: M4- Preview the Slide Presentation
Course: Open PRO131 Instrumentation II > Section: Module 4: Programmable Logic Controllers (PLCs)

Action Required

Preview These Chapter PowerPoint Presentation Slides

Throughout the course I will be posting the PowerPoint presentations that I will use go over the content you will have previewed before class. Use the PDF below to prepare your questions for class. You are responsible for being ready for each class BEFORE we meet in the classroom for lecture, lab or other activities.

Chapter_20_PRO131