Title: Watch These UPS Videos Prior to Class
Course: Open PRO131 Instrumentation II > Section: Module 6:& Instrumentation Power Supply Emergency Shutdown (ESD), Interlocks & Protective Devices

Watch the videos below to become familiar with the Instrumentation Power Supply and Emergency Shutdown, Interlocks & Protective Devices in this mod.

Basics of UPS Systems

http://www.youtube.com/watch?v=pRiLgc4nd_Y

LPG Emergency Tank Shut Off Valves

http://www.youtube.com/watch?v=eFn0xlkHrrM

Emergency Shut Down system - Turbine Engines: A Closer Look

http://www.youtube.com/watch?v=gx6xv0yawkw

How Lubrication System Works

http://www.youtube.com/watch?v=mmmcj53TNic

Hydrogen Sulfide Principles (Safety)

http://www.youtube.com/watch?v=TXt6Z64tYOg&playnext=1&list=PL7nnQ4lKXjFASvLVyzQsG9Hrl61cZ0GSP&feature=results_video