Title: Rates: Integrated Energy
Course: Open PRO131 Instrumentation II

On average, Rifle, Colorado receives 165 kilowatt-hours
of solar insolation per month (30 days = 1 month).

Question: What is the kW-h of solar insulation per day?

Watch this demonstration of how to solve the problem above:
Determining kilowatt-hours
brought to you by Livescribe

How do I view this pencast?