Title: Algebraic Equations and Formulas: Integrated Energy
Course: Open PRO131 Instrumentation II

A 110 volt wall outlet supplies power to a strobe light with a resistance
of 2200 ohms.

Questions: 1. How much current is flowing through the strobe light?

2.  How much power is needed to run the strobe light?

Watch this demonstration of how to solve the problem above:
Solving Equations: Integrated Energy
brought to you by Livescribe