Title: Measurement Conversions: Integrated Energy
Course: Open PRO131 Instrumentation II

The average home consumes 6,408,000 watts of
energy per month.  Use the conversion factor
1 kilowatt (kW) = 1000 watts (W) to convert the following.

Question:  How many kW does the average home consume in a month?

Watch the demonstration below to find out how to solve this problem:
Use the formula to convert the following.

Question: Determine the Kelvin temperature for water boiling at .

Watch the demonstration below to find out how to solve this problem:
Watt Conversions: Integrated Energy brought to you by Livescribe How do I view this pencast? | Converting to Kelvin: Integrated Energy brought to you by Livescribe How do I view this pencast?