Title: Malfuntion! Malfunction!
Course: Open PRO131 Instrumentation II > Section: MODULE 7: Instrumentation Malfunctions & Culminating Activiies - Review, Final Lab, Test & Course Evaluations

Action Required  Look around your home or workplace and think of all the different instrument and control malfunctions you have or could have experienced in either of these places; some examples would be heating or air conditioning system failures, clothes dryer failures, and automobile system failures such as the exhaust gas sensor or oxygen sensor or...???

First post: Choose one malfunction and explain what happened to the class, you may add images if you wish and how the issue was resolved.

Peer Response: On another day, respond to a peer's first post by explaining how you can prevent what happened to them from happening to you.