Title: Simtronics #3: SPM-1400 Centrifugal Compressor
Course: Open PRO130 Instrumentation I > Section: Module 4: Pump, Compressor & Heat Exchanger Systems

Troubleshooting Is about information; to be good at troubleshooting, you must have a good understanding of the process you are working on. We will start with this very simple system get familiar with it. The more familiar you are with the system the easier it is to diagnose problems.

The Simtronics Virtual Training Environment allows you to read and interpret process information and improve your level of process knowledge and trouble-shooting skills. We will use Simtronics several times during this class.
Action Required

1. Complete the shut down and start up procedure by the manual until you can do it with few to no alarms.
2. Next experiment with manual control change the flow rates level set-points.
3. Notify me of problems and let me know when you have completed this lab and I will check your abilities and give you a grade.

Reviewing the manual will save time when completing module .