Title: Mod 5 LabVolt
Course: Open PRO130 Instrumentation I > Section: Module 5: INTRO TO CONTROL LOOPS: SIMPLE LOOP THEORY & PRIMARY SENSORS, TRANSMITTERS, AND TRANSDUCERS

In your LabVolt manual:

1. Read Exercise 2.4 carefully, studying the images along the way so that you are prepared for our in-class lab session. You will not have time to prepare DURING class, in order to assure that everyone prepares ahead and is ready to do the experiments with their teams, I will randomly give a pop quiz at the start of class. Please be a good team player!
2. Next download and print the experiment outline of the exercise you will be completing during our upcoming lab at this link.
3. Bring the print out to class as you will fill out the form during lab
4. You will be able to keep the hard copy you have filled out for reference.
5. You will turn in a digital copy with your of your experiment in the Lab area of this course.