Title: Check Your Knowledge Chapters 8 & 9
Course: Open PRO130 Instrumentation I > Section: Module 5: INTRO TO CONTROL LOOPS: SIMPLE LOOP THEORY & PRIMARY SENSORS, TRANSMITTERS, AND TRANSDUCERS

At the end of each chapter in your textbook, you will find a section called "Checking Your Knowledge", answering the questions in this section will be a regular module assignment.

You may write your answers by hand or create in a word-processing document, it's up to you. You should submit just one file or hard copy with the answers to each chapter assigned within the module. If you submit a hard copy you must post a note to me in the textbox -

I turned this assignment in on paper as a hard copy

Action Required

- Read the assigned chapters - answer the Checking Your Knowledge questions, submit all of your answers for the mod in one word file attachment or you may submit your answers in the classroom as a hard copy (see note above)

Suggestion:Since you are assigned two chapters, you should plan to read a chapter and answer those questions, then read the remaining chapter and answer those questions and then submit.

I will review your assignments and enter your grade in your Grades area in Canvas.

How submit an assignment Canvas? If at anytime you need to know how to do something in Canvas, check their excellent student guides http://guides.instructure.com/m/4212  -topics are listed on the right side of the page or you can type in a keyword (like assignment).