Title: On the Job 5: Debriefing the Lab
Course: Open PRO130 Instrumentation I > Section: Module 5: INTRO TO CONTROL LOOPS: SIMPLE LOOP THEORY & PRIMARY SENSORS, TRANSMITTERS, AND TRANSDUCERS

Action Required:

How did your lab go? Were you able to do the experiment? Were there any surprises along the way?

First Post: Explain your answers to the above questions giving details and specifics

Response to Peer: On another day, respond to a peer's first post with additional information.