Title: Heat Exchanger Failure Diagnosis, Goodman GMP Model
Course: Open PRO130 Instrumentation I > Section: Module 4: Pump, Compressor & Heat Exchanger Systems

www.youtube.com/watch?v=S8AI8VZQ-ts