Title: Module Blueprint 3
Course: Open PRO130 Instrumentation I > Section: Module 3: PROCESS VARIABLES, ELEMENTS, AND INSTRUMENTS: LEVEL & FLOW

Module Overview | Module Learning Objectives
Face-to Face

At this meeting we will...

Online

1. First read through any of my "The Big Picture" pages.
2. Next familiarize yourself with the discussion questions so that you can be thinking of them while you read. Note posting deadlines.
3. Then for this mod you want to read and then answer the questions as described.
4. Work on the Your Calculations Corner well before the end of the mod so that you can get feedback from me before the quiz.
5. Take the quiz when you feel like you will do well.
6. Complete assignments before the due dates-remember, the "due" date is not the "do" date.
By the end of this module, you will be able to:

Chapter 4

- Define terms associated with level and level instruments.
- Identify the most common types of level-sensing/measuring devices used in the process industries.
- Describe the purpose and operation of various types of level-sensing and measuring devices.
- Describe the relationship between temperature and level control as it relates to the density of liquid.
- Describe the relationship between temperature and level control as it relates to the volume of a liquid.

Chapter 5

- Define flow and terms associated with flow.
- Define terms associated with flow measurement.
- Identify the most common types of flow-sensing and measuring devices used in the process industries.
- Describe the purpose and operation of flow-sensing/measurement devices used in process industry.
- Explain the difference between total volume flow, flow rate, and volumetric flow.