Title: Heat Exchangers
Course: Open PRO130 Instrumentation I > Section: Module 4: Pump, Compressor & Heat Exchanger Systems

This is an hour long but you should benefit if you watch, takes notes, and bring questions to class.

www.youtube.com/watch?v=jc_hL_tSFzo