Title: On the Job 6: Debriefing the Industry Tour
Course: Open PRO130 Instrumentation I > Section: Module 6: CONTROL LOOPS: CONTROLLERS & FINAL CONTROL ELEMENT OVERVIEW, CONTROL VALVES & REGULATORS

Action Required: .

First Post: Open forum- what were your thoughts and experiences at the plant?

Response to Peer: On another day, ready through your peers postings and respond to any posts that interest you. Please answer any questions asked of you.