Title: Waste Water Evaporation
Course: Open PRO125-Process Tech 1-Equipment 2 > Section: Module 2: Tools & Separation Equipment

https://www.youtube.com/watch?v=dHAIl39P1hY

Mining operators need water to make bare rock give up its valuable minerals, however stricter regulations on acid mine drainage, removing metals from process water, and total dissolved solids (TDS) are pushing companies to look for more environmentally friendly solutions.

Often tailing ponds are used to hold large quantities of process water. The evaporation process may be carried out naturally in solar evaporation ponds but this approach is slow and requires a great deal of land area. The cost of constructing additional storage ponds and the added cost of clean up and re-vegetation are often prohibitive.

Mechanical Evaporation machines can rapidly increase the evaporation process, with up to 14 times more efficiency than space taken by the same area of pond. Our Evaporation Machines are relatively compact, reliable, efficient and portable.