Title: D6-Environmental Control Incidents
Course: Open PRO125-Process Tech 1-Equipment 2 > Section: Module 6: Environmental Control Equipment

Action Required

Think about: The case studies you read about (and took notes on) earlier this mod. Refer to them at http://www.cee-corp.com/

First post -  Do some research on an incident that caused the need for environmental control equipment or a safety act. You will probably have the best luck by starting with library database research. Look for articles that relate to environmental or safety hazards and then find follow-ups where prevention equipment was initiated. Share your research here by telling the story of the incident and relating how it is now prevented by equipment.

Response to Peer - on another day, comment on your peer's postings with either additional information or a question.