Title: Checking Your Knowledge Ch 22
Course: Open PRO125-Process Tech 1-Equipment 2 > Section: Module 7: Mechanical Power Transmission and Lubrication

At the end of each chapter in your textbook, you will find a section called "Checking Your Knowledge", answering the questions in this section will be a regular module assignment. Although you may initially write your answers by hand, you will need to open a word-processing document, and then type in your answers to the questions so you can submit the file here by attachment.You should submit just one file with the answers to each chapter assigned within the module.

Action Required

- Read the assigned chapters
- Answer the Checking Your Knowledge Questions
- Submit all of your answers for the mod in ONE word file attachment. Make sure to indicate the Chapter number and your name.