Title: Module Overview-7
Course: Open PRO125-Process Tech 1-Equipment 2 > Section: Module 7: Mechanical Power Transmission and Lubrication

Module Overview: | Module Learning Objectives
First Face-2 Face Class

- Chapter
- Lab

Online

In order to achieve those learning objectives to the right, you will have to take action! For this module, you should:
1. First read, watch or listen to the videos.
2. Download the PDF take notes and write questions for the classroom.
3. Next Read the Chapter assigned for this mod
4. Answer and submit the questions in the Checking Your Knowledge.
5. Complete the Reading & Understanding quiz
By the end of this module you will be able to:

1. Describe the principles of mechanical power transmission and lubrication in the process industries.
2. Describe the purpose of mechanical power transmission components.
3. Describe the operating principles of mechanical power transmission.
4. List the types of bearings and explain the purpose of each.
5. List the types of gears and their uses.
6. Describe safety and environmental hazards associated with mechanical power transmission and lubrication.
7. Describe the process technician’s role in mechanical power transmission and lubrication procedures.
8. Identify potential problems associated with mechanical power transmission and lubrication.