Title: Forklift Operations & Preventative Maintenance
Course: Open PRO125-Process Tech 1-Equipment 2 > Section: Module 2: Tools & Separation Equipment

Watch this 13 minute video presented by our guest speaker the Utah DOT:

http://youtu.be/J-enGU-EJ0c

And this 8 minute video

http://youtu.be/BnshG8o6dbY