Title: Chapter Reading - 3, 4, & 5
Course: Open PRO120 Equipment 1 > Section: MODULE 2: Pipes, Valves, Tanks & Vessels

- Chapter 3: Piping, tubing, hoses and fittings

-- Read whole chapter, including Figures and Tables

-- Pay attention to Size (shape), Materials (property), Temperature, and  Pressure

- Chapter 4: Valves

-- Read whole chapter, including Figures and Tables

-- Pay attention to components, types, potential problems, hazards, and technician's role

- Chapter 5: Tanks & Vessels

-- Read whole chapter, including Figures and Tables

-- Pay attention to types, shapes, components, and auxiliary equipment