Title: Chapter Reading- 9 & 10
Course: Open PRO120 Equipment 1 > Section: MODULE 5: Electrical Distribution, Motors. Engines & Mechanical Power

- Electrical distribution and motors (Chapter 9)
- Engines (Chapter 10)