Title: Reading & Understanding Quiz 1
Course: Open PRO120 Equipment 1 > Section: MODULE 1: Getting Started & Intro to Equipment & Tools

Q: Using your OWN WORDS, define the following terms by typing your answer in the textbox below. You may want to write it out in a word processing document first and then copy and paste your answer here in the textbox.

a. Process drawing

b. Process industries

c) Process technician

d. Process Technology

e. Troubleshooting

f. Unit

Q: Equipment troubleshooting is a skill that can be learned only in the classroom environment.
- True
- False
A: False

Q: Process drawings include: (Select all that apply)
- plot plans
- electrical diagrams
- schematics
- system flow diagrams
A: plot plans; electrical diagrams; schematics; system flow diagrams

Q: Selection of the proper tools for a job is the sole responsibility of the tool room clerk.
- True
- False
A: False