Title: Chapter Reading - 6 & 7
Course: Open PRO120 Equipment 1 > Section: MODULE 3: Pumps & Compressors

Please take more time to this module as both pumps and compressors that are very common equipment in oil & gas industry.

- Chapter 6: Pumps

- Read whole chapter, including Figures and Tables

-- Pay attention to different type of pumps and their operating principles

- Chapter 7: Compressors

-- Read whole chapter, including Figures and Tables

-- Pay attention to types, components, operating principles, potential problems, and performance curves