Title: Module Overview-1
Course: Open PRO120 Equipment 1 > Section: MODULE 1: Getting Started & Intro to Equipment & Tools

Module Overview: Getting Started & Intro to Equipment & Tools | Module Learning Objectives
First Face-2 Face Class

1) Introductions

2) How this class is organized-overview of the hybrid format for this class

3) Syllabus / Instructor Expectations

4) Chapter 1

5) Questions and Suggestions

Online

In order to achieve those learning objectives to the right, you will have to take action! For this module, you should:
1. First read, watch or listen to the videos.
2. Flip through my PPTs, download the PDF versions to take notes and write questions for the classroom.
3. Next Read the Chapter 1 for this mod-follow the directions in the Chapter 1 Reading overview.
4. Participate in the 'Goals discussion forum as outlined within the forum
5. Complete the beginning assignments and other assignments
6. Make sure to be familiar the hybrid learning mode.
By the end of this module, in addition to being able to navigate Canvas and meeting your classmates, you will be able to:

1. Navigate Canvas
2. List types of equipment used in refining and petrochemical industries
3. Describe equipment operations common to the refining and petrochemical industries.
4. Describe the appropriate uses of basic hand tools.
5. Describe the appropriate uses of basic power tools.
6. Describe the appropriate uses of sparking and non-sparking tools.
7. Describe hand and power tool safety.
8. Describe the appropriate care of hand and power tools.
9. Identify and describe the appropriate uses of lifting equipment.
10. Describe the importance of plant equipment maintenance and predictive/preventive
11. maintenance procedures in the refining and petrochemical industries.
12. Discuss different plant approaches to assigning operator performed maintenance tasks.
13. Describe the Process Technician’s role in performing maintenance tasks.