Title: Reading & Understanding Quiz 7
Course: Open PRO120 Equipment 1 > Section: MODULE 7: Furnaces & Boilers

Q: Furnaces are often referred to as process heaters.
- True
- False
A: True

Q: Required for combustion of the fuel in any furnace.
- Carbon Monoxide Boilers
- Excess Air
- Forced Draft
- Fuel-Oil Burners
- Pressure Reducing Stations
A: Excess Air

Q: Furnaces are used for processes, such as:

(Choose all that apply)
- Crude oil distillation
- Distillation columns
- Heat exchangers
- Hydrocracking
- Turbine drivers
A: Crude oil distillation; Hydrocracking

Q: Critical to good operation of furnaces and fired heaters.

(Choose all that apply)
- Amount of excess air
- Ceramic lining of the burner
- Excess air temperature
- Geometry of the burner
- Smoke generation
A: Amount of excess air; Ceramic lining of the burner; Geometry of the burner

Q: Type of burner used to ignite a larger burner.
- Combination burners
- Oil burners
- Pilot burners
- Raw gas burners
- Stage burners
A: Pilot burners