Title: Welcome to ! (Hey, instructor! After you import this course into your "real" course, you will copy the content of this message into a new announcement so that your face shows instead of mine!
Course: Open PRO120 Equipment 1

Welcome Students

Turn on your speakers or put on your headphones, then click this link to listen to my greeting and explanation of how to get started in this class. Then close the video window when you are finished (just under 5 minutes) and carefully read through my announcement below. http://screencast.com/t/dFsWqritGq5U

Follow these procedures whenever you log into class:

1. First read my Announcement here; this is where I will communicate with you as if I were talking to you in our classroom.
2. Next click on the Inbox tab at the top of this window and check your "Inbox" to read any message and reply to messages there.
3. Then you can begin your learning by going to the Modules button where you will find ALL other information you need to participate in this class.

- Begin class for the first time by viewing my welcome message to you.
- Next complete the Student Orientation To Canvas assignment where you will learn how to navigate CANVAS our learning management system.
- Now READ ALL of the Course Information in the next module. This is our course syllabus- the documents in this folder have the answers to most of your questions.
- Print out the Course Calendar and Assignment Schedule & read the tips for success at the end of this page. This is the most important document in the course! Follow the due dates carefully!
- Finally, read the Module Overview to see what you will be doing/learning in the module and then get busy!

The class has officially begins on Monday, August 26. Begin participating right away and I will see you in class tonight  :)