Title: Block Flow Diagram
Course: Open PRO120 Equipment 1 > Section: MODULE 4: Process Drawings & Turbines

Action Required

Draw a Block Flow Diagrams (BFD) for the Biofuels Plant, including boilers, sterilization tank.You may choose to use one of the tools suggested below, or your own idea and submit here in Canvas.

Suggested Drawing Tools

- Open Office - download this one-it's like Microsoft Office but FREE! Try Draw or Impress.
- Sketchup (use the free version-download to your computer-this is VERY good!)
- Word or PowerPoint- these work fine, especially PPT
- OR Draw the BFD and submit a picture of your drawing
- Google Drawings (in the clouds - good for the basics