Title: Anatomy of a Disaster
Course: Open PRO110 Safety, Health & Environment > Section: Module 1: Getting Started - Introduction To Safety Health and Environment, & Hazard Identification and Classification

Action Required

Watch the Anatomy of a Disaster video below, you will need to spend about an hour so you may want to watch it in parts-this is not typical for our course, usually I will assign short videos, less than 15 minutes.

While you are watching, decide whether you think that the operator(s) had control of the start-up of the ISOM unit. What other factors contributed to this disaster? Were written procedures followed? Was the operator provided with a complete set of notes? Did the changing shift have any impact?

http://youtu.be/XuJtdQOU_Z4