Title: Measuring Geometric Solids for Process Technology
Course: Open MAT107 Contextualized > Section: Circles, Polygons & Geometric Solids

This right cylindrical tank has a radius of approximately 1.5 feet and a height of approximately 3 feet.

Question:  Find the volume of the tank in the photo.

Watch this demonstration of how to solve the problem above:
Calculating Volume: Process Technology
brought to you by Livescribe