Title: Measurement Conversions: Process Technology
Course: Open MAT107 Contextualized > Section: Units of Measure

Use the conversion rate 1 therm = 100,000 Btu Question:  Convert 780,000 Btu to therms. Watch the demonstration below to find out how to solve this problem: | Use the conversion rate 1 Joule = 0.73756 ft-lb f Question: Convert 156,875 J to foot-pounds. Watch the demonstration below to find out how to solve this problem:
Unit Conversions: Process Technology brought to you by Livescribe How do I view this pencast? | Unit Conversions: Process Technology brought to you by Livescribe How do I view this pencast?