Title: Measuring Geometric Solids for Integrated Energy
Course: Open MAT107 Contextualized > Section: Circles, Polygons & Geometric Solids

A bucket in the shape of a right circular cylinder with a radius of 8

inches and height of 24 inches takes 30 seconds to fill.

Question:  Determine the flow rate in gallons per minute (gpm.)

Use the conversion factors below:

Watch this demonstration of how to solve the problem above:
Determining Volume:  Integrated Energy
brought to you by Livescribe