Title: Powers of Ten and Scientific Notation: Process Technology
Course: Open MAT107 Contextualized > Section: Powers of Ten and Scientific Notation

1 kilowatt-hour is approximately Joules

Question: How is this written in standard form?

Watch this demonstration of how to solve the problem above:
1 gallon per minute is approximately 0.002228 cubic
feet per second.

Question: Write this in scientific notation.

Watch this demonstration of how to solve the problem above:
Scientific Notation: Process Technology brought to you by Livescribe | Solving Proportions: Process Technology brought to you by Livescribe