Title: Lesson
Course: Basic of Motor Theory (IC 105-IC 105) > Section: Web Content

Points in the servo and stepper section are:
General characteristics of the permanent magnet DC motors, wound armature and moving coil motor
Speed and rotation control of the wound armature DC motor
Types of stepper motor construction and operation
AC servo motor operation by means of  phasing the stator windings
Reading Assignment:
Industrial Control Electronics - Chapter #7   Servo Motors
Optional - Industrial Motor Controls - Chapter #35  Stepping Motors
I have a copy of the Industrial Motor Controls book in the "Main Page" under "Handouts".
The power point for this assignment can be found under the "Handout" section.
There are videos posted in the "Video" section for further explanation of the content for this week.
In the "Coursework" section you will need to create a word document and answer the Problems (1-21) at the end of chapter #7 in the Industrial Control Electronics textbook, when you have them completed upload them for grading.
Also in the coursework you will need to go to the remote server and open the software titled "Troubleshooting Motor Circuits", click on the box labeled Practice Exercises. You will need to complete Lab Exercise 1 and Lab Exercise 2. You will not need to download or save them as I will go in after the close date and check the progress and grade through the management software.