Title: Zener Diode Lab
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

A: 1 = 0A; 2 = 0A; 3 = 888.178nA; 4 = 0A; 5 = 0A; 6 = 499.156microA; 7 = 2.492mA; 8 = 4.484mA; 9 = 10.457mA; 10 = 20.419mA; 11 = 30.377mA; 12 = 40.339mA

A: 1 = 2V; 2 = 6V; 3 = 7V; 4 = 8V; 5 = 9V; 6 = 9.75V; 7 = 9.755V; 8 = 9.759V; 9 = 9.771V; 10 = 9.791V; 11 = 9.811V; 12 = 9.831V

A: 1 = 27.756nA; 2 = 55.511nA; 3 = 388.578nA; 4 = 8.549microA; 5 = 77.272microA; 6 = 215.827microA; 7 = 381.917microA; 8 = 558.997microA; 9 = 742.073microA; 10 = 2.666mA; 11 = 4.633mA

A: 1 = 200.002mV; 2 = 299.997mV; 3 = 399.831mV; 4 = 495.72mV; 5 = 561.38mV; 6 = 592.069mV; 7 = 609.102mV; 8 = 620.492mV; 9 = 628.956mV; 10 = 667.194mV; 11 = 683.752mV