Title: Power Supply Lab
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

Q: What is the AC voltage of the output at the load? (multimeter)
A: 5.088V

Q: What is the AC voltage of the output at the load, with any one of the switches open?
A: 5.993V

Q: What is the approximate peak voltage of the oscilloscope? (at the load)
A: 15V

Q: What is the approximate peak voltage of the oscilloscope at the load, with the switch open?
A: 15V

Q: What is the DC voltage of the output at the load? (multimeter)
A: 9.57V

Q: What is the DC voltage of the output at the load, with any one of the switches open?
A: 4.777V

Q: What is the output wave form when any one of the switches are open?
- half wave
- full wave
A: half wave

Q: What is the approximate DC voltage reading on the o'scope at the load? (DC coupling)
A: 11.5V

Q: What is the approximate peak to peak voltage of the o'scope at the load? (AC coupling)
A: 600mV

Q: What is the multimeter AC voltage?
A: 182.646mV

Q: What is the multimeter DC voltage?
A: 11.634V

Q: What is the ripple factor?
A: 5.15%

Q: With any switch open, what is the approximate peak to peak voltage of the o'scope at the load?
A: 1.2V

Q: With any switch open, what is the DC voltage reading of the o'scope at the load?
A: 10V

Q: With any switch open, what is the multimeter DC voltage?
A: 9.905V

Q: With any switch open, what is the mulitmeter AC voltage?
A: 377.46mV

Q: With any switch open, what is the ripple factor?
A: 12.1%