Title: Thyristor Ohmmeter Tests
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 Reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)

Q: With the meter set on "Diode Check", what will the meter display read?
- High reading (as if open)
- Low reading (as if forward biased)
- 0 reading (as if shorted)
A: High reading (as if open)