Title: Diode Lab
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

Q: Table 1
Fill in the answers to the middle column (VD1).
A: 1 = 99.911mV; 2 = 199.195mV; 3 = 293.985mV; 4 = 370.047mV; 5 = 417.873mV; 6 = 447.291mV; 7 = 467.275mV; 8 = 482.073mV; 9 = 493.708mV; 10 = 503.245mV; 11 = 553.959mV; 12 = 606.783mV; 13 = 642.847mV; 14 = 663.29mV

Q: Table 1
Fill in the answers to the third column (I).
A: 1 = 83.267nA; 2 = 832.667nA; 3 = 5.995 microA; 4 = 29.976 microA; 5 = 82.157 microA; 6 = 152.878 microA; 7 = 232.814 microA; 8 = 317.968 microA; 9 = 406.231 microA; 10 = 496.714 microA; 11 = 1.446 mA; 12 = 4.393 mA; 13 = 9.358 mA; 14 = 14.339 mA

Q: Table #2
Complete the 3rd column (I).
A: 1 = 111.022nA; 2 = 0A; 3 = 1.776 microA; 4 = 0A; 5 = -3.553 micro A; 6 = 0A

Q: Table #2
Complete the middle column (VD1).
A: 1 = 999.987mV; 2 = 5V; 3 = 10V; 4 = 15V; 5 = 20V; 6 = 25V