Title: Op-Amp
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

Q: Change the input back to 1V and change R2 to 100K ohm.
What is the actual voltage gain of the circuit as determined by the measured values of V_in and V_out ?
A: 10

Q: Does increasing the value of R_2 have any significant effect upon the voltage gain of the circuit?
- yes
- no
A: yes

Q: Change the input to 2V.
Does increasing the value of V_in have any significant effect upon the voltage gain of the circuit?
- yes
- no
A: yes

Q: The output waveform is shifted __________ relative to the input waveform.
- 0 degrees
- 90 degrees
- 180 degrees
A: 0 degrees

Q: What is the actual voltage gain of the circuit as determined by the measured values of V_in and V_out ?
A: 5

Q: Adjust the input voltage to 2V peak.
Does increasing the values of V_in have any significant effect upon the voltage gain of the circuit?
- yes
- no
A: yes

Q: Change the value of R2 to 100K ohm.
What is the actual voltage gain of the circuit as determined by the measured values of V_in and V_out ?
A: 11

Q: Change the value of R2 to 10K ohms.
What is the actual voltage gain of the circuit as determined by the measured values of V_in and V_out ?
A: 2

Q: The output waveform is shifted _______ relative to the input waveform.
- 0 degrees
- 90 degrees
- 180 degrees
A: 0 degrees

Q: What is the actual voltage gain of the circuit as determined by the measured values of V_in and V_out ?
A: 6