Title: Zener Worksheet
Course: Electronics Theory (IC 102-IC 102) > Section: Assessments

Q: Max zener current ______________
A: 83.333mA

Q: R =
A: 276 Ohms

Q: RL =
A: 145.75 Ohms

Q: Max zener current _____________
A: 232.558mA

Q: R =
A: 67.51 Ohms

Q: RL =
A: 18.57 Ohms