Title: elt106 Ch 7 TYK
Course: Open ELT106 Fundamentals of DC/AC

Q: The total circuit resistance of two 10-ohm resistors connected in parallel is 20-ohms.
- True
- False
A: True

Q: The total resistance of a 12-ohm and an 8-ohm resistor connected in parallel is 48 ohms.
- True
- False (4.80 Ohms)
A: False

Q: Solve for the unknown values in the parallel circuit below.

RT = __________ Ω

IT = __________ A

PT = __________ W

ER_1= __________ V

ER_2 = __________ V

ER_3 = __________ V

IR_1 = __________ A

IR_2 = __________ A

IR_3 = __________ A

Q: Solve for the unknown values below.

RT = __________ Ω

ET = __________ V

PT = __________ W

IR_1 = __________ A

IR_2 = __________ A

IR_3 = __________ A

Q: In a parallel circuit containing a 4-ohm, a 5-ohm, and a 6-ohm resistor, the current flow is:
- highest through the 4-ohm resistor.
- lowest through the 4-ohm resistor.
- highest through the 6-ohm resistor.
- the same for all three resistors.
A: highest through the 4-ohm resistor.