Title: Required Textbook
Course: Open ELT106 Fundamentals of DC/AC > Section: Relevant Course Information

ISBN 1-59070-883-5

Electricity & Electronics, 10th Edition,

Gerrish, Dugger, & Roberts, The Goodhart-Wilcox Company Inc., Tinley Park Illinois, 2009.

Also any good scientific calculator will suffice. Graphing calculators are an excellent learning tool and may save you significant time.