Title: elt106 ch 6 TYK
Course: Open ELT106 Fundamentals of DC/AC

Q: In a series circuit, the current values  __________ everywhere in that circuit.
- are the same
- are different
- are variable
A: are the same

Q: In a series circuit, the source voltage is equal to the sum of the individual voltage drops.
- True
- False
A: True

Q: 50 ohms is the total circuit resistance for two 25 ohm resistors connected in series.
- True
- False
A: True

Q: When resistors of equal value are connected in series, they will develop voltage drops of different values.
- True
- False
A: False
Feedback: Equal value

Q: Two 25 ohm resistors connected in series will require a __________ voltage source to produce  a 6 volt voltage drop across one 25 ohm resistor.
- 6 Volt
- 9 Volt
- 12 Volt
- None of the above are correct
A: 12 Volt

Q: Using the circuit below, solve for the unknown

RT = ___________ ET =___________ PT =  ___________

IR1 = ___________ ER1 = ___________ PR1 = __________

IR2 = ___________ ER2 = ___________ PR2 = __________

IR3 = ___________ ER3 = ___________ PR3 = __________

Q: Using the circuit, solve for the unknown values

RT = ___________ ET =___________ PT =  ___________

IR1 = ___________ ER1 = ___________ PR1 = __________

IR2 = ___________ ER2 = ___________ PR2 = __________

IR3 = ___________ ER3 = ___________ PR3 = __________