Title: Student Forum: Electricity Laws & Safety
Course: Open ELT106 Fundamentals of DC/AC > Section: MODULE 1: Getting Started in Electronics DC/AC

Action Required:

Choose ONE of the following topics and review what you learned about the topic by referring to your books, notes, online presentations and video.

- Coulombs Law
- The Law of Charge
- Safe Electrical Work Habits
- First Actions/Aid for Electric Shock

First post: Pretend that you are the professor of  DC/AC and want to teach your students the most important points about the topic. Compose a short lesson  a paragraph or two is sufficient. Your goal is to be clear, concise complete, and correct so that your students can understand the topic. You may use any tools you like to teach your topic including sharing additional information from on the Internet.

Response to peer: On a different day, read the other students lessons and respond to TWO students who picked a different topic than you by asking them a question to clarify or expand on the topic they chose.

EVERYONE! You must respond to questions asked of you so keep up on this forum!

I will read and then rate your posts according to our rubric.

Tips

- View the Discussion Overview & Rating Rubric so that you understand what is required and what it's worth to you.
- You may use the "I" pronoun in our discussions because your responses will not be essays but more conversational. First you should think about and compose your response in a word processor like Word. Then respond to the questions above by copying and pasting your response, this way you can work on your responses without being connected to the Internet.
- How do I post and reply in Canvas? If at any time you need to know how to do something in Canvas, check their excellent student guides http://guides.instructure.com/m/4212  -topics are listed on the right side of the page or you can type in a keyword (like discussion).