Title: Sinusoidal Motion Demonstration
Course: Open ELT106 Fundamentals of DC/AC > Section: MODULE 4: Electricity & Magnetism

Please watch this demonstration presented by me, your instructor to help enhance your understanding of the sinusoids that are around you everywhere.

http://youtu.be/zF8X-3iLpGQ