Title: Video Template
Course: Open ELT106 Fundamentals of DC/AC

It takes 3 minutes to fill a 42 gallon barrel of crude oil.

Question: What is the flow rate?

Watch this demonstration of how to solve the rate problem above:

The air pressure at sea level is 147 pounds to 10 square inches.

Question: What is the air pressure at sea level?

Here is a demonstration on how to solve the rate problem above: