Title: Measurement Conversions: Integrated Energy
Course: Open ELT106 Fundamentals of DC/AC > Section: Math Refresher for Module 1

Use the conversion factor 1 kilowatt (kW) = 1000 watts (W) to convert the following.

The average home consumes 6,408,000 watts of energy per month.

Question:  How many kW does the average home consume in a month?

Watch the demonstration below to find out how to solve this problem:
Use the formula to convert the following.

Question:  Determine the Kelvin temperature for water boiling at .

Watch the demonstration below to find out how to solve this problem: