Title: Research Question: Meter Safety & Maintenance
Course: Open ELT106 Fundamentals of DC/AC > Section: MODULE 2: Basic Circuits & Materials, Energy, and Electricity

Action Required

For this assignment, you will need do a little research on meter safety and maintence. Then you will create a four slide presentation using PowerPoint or similar presentation software (see details below). You may use your textbook as one resource,  but you must use at least two additional web resources.

In addition, you will be required to review three of your peers presentation and make brief comments.

Presentation Parameters

- Slide 1 - title slide with your name as presenter
- Slide 2 - bulleted information & appropriate graphic
- Slide 3 - additional bulleted or similar information & appropriate graphic
- Slide 4 - resources with citations in MLA format, minimum of two plus textbook.

Attach your presentation here or paste the URL into the textbox. I will grade the presentation on the above parameters and give you credit for your peer reviews completed.