Title: Final Project Details
Course: Open ELT106 Fundamentals of DC/AC > Section: MODULE 5: AC Power Distribution & Company

Now that you have chosen your topic, done your research and submitted your annotated bibliography, you are read to begin creating your final project. You have several options for documenting and presenting your work. Choose one and be prepared to tell me your chosen methods and give me a brief outline of what I can expect to see in the final draft that you submit to me, and present to the class as well, at our last class meeting.

Documenting & Presenting Methods

1. Formal Report - if you choose this method, you will write an MLA formatted report between 5-8 pages long and you will give a summary of your findings to the class.

2. PowerPoint - if you choose to create a PowerPoint presentation, it should be between 10-12 slides. You will give the presentation in the classroom and answer questions. You may also narrate the presentation and show that version in the classroom.

3. MovieMaker or iMovie (you may use any other movie making application as well) MovieMaker is a free download for PCs and iMovie comes loaded on a MAC; both are easy to use. If you choose this option, your movie should be between 5-8 minutes and should NOT be a talking head.

This will be a competitive assignment. The best projects will obtain the best grades. Mediocre and inadequate projects will be graded accordingly. All projects will be evaluated on the following characteristics and as shown on the grading rubric for this final project. You will have a chance to have one of your peers look over your project before the final draft is submitted to me.

- Depth
- Clarity
- Accuracy
- Composition including organization
- References (MLA formatted)
- Effort