Title: WISE Grant MFGT 244 - Preventative Maintenance

Week 1 Reading Industrial Maintenance S1C1 Safety
  Week 1 Safety Lock Out / Tag Out
  Week 1 Participation 12 Jan 2018
  Safety Quiz
Week 2 Reading Industrial Maintenance S5C29 Preventive Maintenance
  Week 2 Coolant Management in the Machine Shop
  Week 2 Participation 19 Jan 2018
Week 3 Reading Industrial Maintenance S2C9 Lubrication
  Week 3 Lubrication of Machinery
  Week 3 Participation 26 Jan 2018
Week 4 Reading Industrial Maintenance S5C30 Mechanical PM
  Week 4 Machine Leveling
  Week 4 Participation 2 Feb 2018
Week 5 Reading Industrial Maintenance S2C8 Coupled Shaft Alignment
  Week 5 Machinery Shaft Alignment
  Week 5 Participation 9 Feb 2018
Week 5 Midterm Exam
  Mid Term 9 Feb 2018
Week 6 Vibration Analysis
  Week 6 Machinery Vibration Analysis
  Week 6 Participation 16 Feb 2018
Week 7 Reading Industrial Maintenance S2C10 Seals and Packing
  Week 7 Seals and Packing
  Week 7 Participation 23 Feb 2018
Week 8 Reading Industrial Maintenance S2C7 Bearings
  Week 8 Bearings
  Week 8 Participation 2 Mar 2018
Week 9 Reading Industrial Maintenance S5C31 Electrical PM
  Week 9 Electrical PM
  Week 9 Participation 9 Mar 2018
Week 10 Industrial Maintenance Management Power Point Presentation
  Week 10 Maintenance Management Systems
  Week 10 Participation 16 Mar 2018
Week 11 Final 03/23/2018
  Final