Title: Week 1 Safety Lock Out / Tag Out
Course: WISE Grant MFGT 244 - Preventative Maintenance > Section: Week 1 Reading Industrial Maintenance S1C1 Safety

- Review safe shop practices
- Lock Out / Tag Out requirements
- organized and clean work environment
- horse play leading cause of accidents in the work place
- unsafe condition recognition
- unsafe acts
- identification of task hazards
- Planning work to mitigate hazards