Title: Week 2 Reading Assignment
Course: WISE Grant MFGT 155 Quality Assurance Fundamentals > Section: Week 2 Module

Read Pages 6 through 20 in The Ultimate GD&T Pocket Guide, 2nd Edition

Also, read the Wikipedia article about Quality Assurance ... https://en.wikipedia.org/wiki/Quality_assurance

Optional:  Read Chapters 3, 5, 6, 7 and 8 in Fundamentals of Dimensional Metrology, 5th or 6th Edition