Title: Syllabus Quiz
Course: Canvas Practice Course > Section: Syllabus

Q: Which of the following is NOT a course objective of DT250 Preventative Maintenance?
- Identify failed components based only on operator description
- Identify the criteria for putting avehicle out of service
- Understand inspector qualifications and record-keeping requirements
- Explain the procedures of a pre-trip inspection and preventive maintenance inspection
A: Identify failed components based only on operator description

Q: Who's responsibility is it to obtain text books, worksheets and materials for the class and shop activities?
- The student
- The instructor
- Your parents
- The college
A: The student

Q: How long do you have to complete late assignments, worksheets, and exams after their due date?
- One week
- Late work is not accepted.
- Two weeks
- Until the end of the semester
A: One week

Q: What percentage of your grade consists of attendance?
- 10%
- 0%
- 20%
- 30%
A: 10%

Q: How many missed class sessions can result in a recommendation fro withdrawl from the class or a failing grade?
- 3
- 1
- 2
- 4
A: 3