Title: Canvas Practice Course

Syllabus
  SP18DT250_1301_Preventative Maintenance syllabus.docx
  2017 DT250 PM Class Schedule.xlsx
  Syllabus Quiz
Attendance
Chapter 55 Preventive Maintenance and Inspection
  Pretest
  Placeholder for copyright material
  Vehicle Inspection Lab
  Driver_Vehicle_Inspection.pdf
  Lubrication and Inspection Report Form from CHP.pdf
  Placeholder for copyright material
  Engine Oil Lab
Lighting Systems
  Placeholder for copyright material
  Lights Lab
5th Wheels
  Placeholder for copyright material
  Placeholder for copyright material
  Group Essay Assignment
  5th Wheel Inspection and Service
  Placeholder for copyright material
  Placeholder for copyright material
Brake Inspections
  Placeholder for copyright material
  Placeholder for copyright material
  Air System Inspection
  Brake Adjustment
Clutch and Transmission PM
  Placeholder for copyright material
  Clutch Adjustment and Fluid Levels Lab
Fluids
  Placeholder for copyright material
  Placeholder for copyright material
  Annual Inspections
Final Exam
  Placeholder for copyright material