Title: Canvas Practice Course

Getting Started
  About this course
  Getting Started (Mandatory Student Forms)
  U. S. Department of Labor
Syllabus and Schedule
  Syllabus 2017 DT 201.doc
  DT201 BrakesClass ScheduleFall 2017.docx
  Pretest
Chapter 29 Fundamentals of Braking
  Placeholder for copyright material
  Chapter 29 Review
Chapter 30 Foundation Systems
  Placeholder for copyright material
  Chapter 30 Review
  Placeholder for copyright material
  Placeholder for copyright material
Labs
  Brake Chamber Remove/Install
  Compressors/Governors
  Brake Adjustment Lab
  Foundation Brakes
  Brake Board ID (all components)
  Brake Board Operation (specific components)
  System Operation Demo
  Valves Labs (2)
  On-Vehicle Air Systems 1st Lab (two lab sheets)
  Lab 2: On-Vehicle Air Brake System Inspection and Testing
  Foundation Brakes ID
  ABS labs 1 and 2
Chapter 31 Air Brake Service
  Placeholder for copyright material
  Chapter 31 Review
  Pop Quiz
  Placeholder for copyright material
  Placeholder for copyright material
Chapter 32 ABS
  Placeholder for copyright material
  Chapter 32 Review
Chapter 24
  Placeholder for copyright material
  Placeholder for copyright material
Final Exam
  Written Final
Attendance
  Attendance Grade