Title: Chapter 48 Special Refrigeration Systems & Applications
Course: Canvas Practice Course

Read Chapter. After reading Chapter do Review Questions.

Review Question can be found in two places. At the end of the chapter. Then in the next module right below this one you can find the next set of review question which is the same as ones in the book. These are the ones that need to be done and turn in.