Title: AC107
Course: Canvas Practice Course

Welcome to the Canvas online portion of the AC107 Electrical and Controls for HVAC/R class.   The complete syllabus can be found in the files section of this course.   Be sure to log into Canvas prior to Jan-28 to confirm your participation in this class.   We will meet in room 209 at the Edison campus on Thursdays beginning Jan-28, at 4:00 pm.