Title: Unit 21 Evaporators and Refrigeration Systems
Course: Canvas Practice Course > Section: Unit 21

Read Unit 21.  Unit review questions (found at the end of the chapter) due after the reading.  I'll accept homework in a word doc, text file, and or handwritten