Title: Reading: (CU3 M2) AAPC Textbook Chapter 8
Course: SkillsCom CRS 111 16.1 > Section: Credit Unit 3 Module 2

Read Chapter 8 of your AAPC Medical Coding Training: CPT ® copyright by the American Medical Association.