Title: Activity: (CU1 M1) Chapter 1
Course: SkillsCom CRS 111 16.1 > Section: Credit Unit 1 Module 1

Use this Quizlet as a study guide to help you better understand the content from Chapter 1.  These are variations of the quiz questions found in your Medical Coding Training text.