Title: Competency Assessment: (CU3 M1) Demonstrate E & M Coding: Risk
Course: SkillsCom CRS 111 16.1 > Section: Credit Unit 3 Module 1

Instructions:

On a daily basis, you must demonstrate that you can both document and evaluate for coding the exam portion of an office visit.   This Competency Assessment will give you an opportunity to work with the Risk assessment of Evaluation & Management.

Review this E & M Coding Tool (Links to an external site.).  Note the yellow parts of the tool that specifically deal with the MDM portion of E & M Coding.  This tool may be helpful in determining from the medical documentation which level of coding should be used for this portion of the E & M Coding.  If you have questions, this is a good time to talk to your Content Expert about how to use this tool.

Assessment:

Open and then submit this document: E & M - Risk (Google Doc)