Title: Reading: (CU2 M1) AAPC Textbook Chapter 4
Course: SkillsCom CRS 111 16.1 > Section: Credit Unit 2 Module 1

Read Chapter 4 of your AAPC Medical Coding Training: CPT ® copyright by the American Medical Association.