Title: Directions for Faculty to Access eText Book
Course: SkillsCom CMA 112 14.0 > Section: CMA 112 - Introduction to Basic Law & Ethical Issues in Healthcare

1. Go to: http://instructors.coursesmart.com/bookshelf?__myxmlid=9781428359413

2. Click on SIGN IN

3. Instructor login = genericinstructor01@linnbenton.edu

4. Password = GenInstructor01

5. On the left hand side of the page, you will see MY TITLES.  Scroll down to the book you want, click on it, and then click on the READ NOW button in the middle of the page.

6. You will be able to view the book just as the student sees the book.

The Book is:

Law, Liability, and Ethics for Medical Office Professionals, 5th Edition

Myrtle R. Flight; Michael R. Meacham

ISBN-10: 1-4283-5941-9

ISBN-13: 978-1-4283-5941-3