Title: Module 2 Introduction: (CU2 M2) The Medical Record and ROS
Course: SkillsCom CMA 111 16.0 > Section: Credit Unit 2 Module 2

What is the difference between medical records and electronic health records?  How are they related to assessing the patient?

In this Module, you will gain an understanding of the "Review of Systems" and how that gets charted into the medical record and/or electronic health record.  Since documentation includes what is observed, it is necessary to observe information that is collected from physical observation of the body systems and then document that. This Module will focus on the Review of Systems.

Module Outcomes:

- List the Body Systems
- Describe how body systems are reviewed for charting.