Title: SkillsCom CMA 102 16.0

CMA 102 - Introduction to Medical Terminology and Body Systems II
  Directions for Faculty to Access the eText Book
Credit Unit 1 Module 1
  Module 1 Introduction: (CU1 M1) The Cardiovascular System
  Reading: (CU1 M1) Chapter 10 The Cardiovascular System
  Lecture Materials: (CU1 M1) The Cardiovascular System
  Self-check: (CU1 M1) Chapter 10 The Cardiovascular System
  Competency Assessment: (CU1 M1) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU1 M1) ANSWER KEY Define Medical Terms
  Activity: (CU1 M1) Definition Practice
  Competency Assessment: (CU1 M1) Chapter 10 Review
  Congratulations! (CU1 M1)
Credit Unit 1 Module 2
  Module 2 Introduction: (CU1 M2) The Respiratory System
  Reading: (CU1 M2) Chapter 11 The Respiratory System
  Lecture Materials: (CU1 M2) The Respiratory System
  Self-check: (CU1 M2) Chapter 11 The Respiratory System
  Competency Assessment: (CU1 M2) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU1 M2) ANSWER KEY Define Medical Terms
  Activity: (CU1 M2) Definition Practice
  Competency Assessment: (CU1 M2) Chapter 11 Review
  Activity: (CU1 M2) Chapter 10 & 11 Review
  Congratulations! (CU1 M2)
END of Credit Unit 1
  CMA 102 Credit Unit Assessment (CU1)
Credit Unit 2 Module 1
  Module 1 Introduction: (CU2 M1) The Digestive System
  Reading: (CU2 M1) Chapter 12 The Digestive System
  Lecture Materials: (CU2 M1) The Digestive System
  Self-check: (CU2 M1) Chapter 12 The Digestive System
  Competency Assessment: (CU2 M1) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU2 M1) ANSWER KEY Define Medical Terms
  Activity: (CU2 M1) Definition Practice
  Competency Assessment: (CU2 M1) Chapter 12 Review
  Congratulations! (CU2 M1)
Credit Unit 2 Module 2
  Module 2 Introduction: (CU2 M2) The Endocrine System
  Reading: (CU2 M2) Chapter 13 The Endocrine System
  Lecture Materials: (CU2 M2) The Endocrine System
  Self-check: (CU2 M2) Chapter 13 The Endocrine System
  Competency Assessment: (CU2 M2) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU2 M2) ANSWER KEY Define Medical Terms
  Activity: (CU2 M2) Definition Practice
  Competency Assessment: (CU2 M2) Chapter 13 Review
  Activity: (CU2 M2) Chapter 12 & 13 Review
  Congratulations! (CU2 M2)
END of Credit Unit 2
  CMA 102 Credit Unit Assessment (CU2)
Credit Unit 3 Module 1
  Module 1 Introduction: (CU3 M1) The Special Senses
  Reading: (CU3 M1) Chapter 14 The Special Senses
  Lecture Materials: (CU3 M1) The Special Senses
  Self-check: (CU3 M1) Chapter 14 The Special Senses
  Competency Assessment: (CU3 M1) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU3 M1) ANSWER KEY Define Medical Terms
  Activity: (CU3 M1) Definition Practice
  Competency Assessment: (CU3 M1) Chapter 14 Review
  Congratulations! (CU3 M1)
Credit Unit 3 Module 2
  Module 2 Introduction: (CU3 M2) The Urinary System
  Reading: (CU3 M2) Chapter 15 The Urinary System
  Lecture Materials: (CU3 M2) Urinary System
  Self-check: (CU3 M2) Chapter 15 The Urinary System
  Competency Assessment: (CU3 M2) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU3 M2) ANSWER KEY Define Medical Terms
  Activity: (CU3 M2) Definition Practice
  Competency Assessment: (CU3 M2) Chapter 15 Review
  Activity: (CU3 M2) Chapter 14 & 15 Review
  Congratulations! (CU3 M2)
END of Credit Unit 3
  CMA 102 Credit Unit Assessment (CU3)
Credit Unit 4 Module 1
  Module 1 Introduction: (CU4 M1) The Male Reproductive System
  Reading: (CU4 M1) Chapter 16 The Male Reproductive System
  Lecture Materials: (CU4 M1) Male Reproductive System
  Self-check: (CU4 M1) Chapter 16 The Male Reproductive System
  Competency Assessment: (CU4 M1) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU4 M1) ANSWER KEY Define Medical Terms
  Activity: (CU4 M1) Definition Practice
  Competency Assessment: (CU4 M1) Chapter 16 Review
  Congratulations! (CU4 M1)
Credit Unit 4 Module 2
  Module 2 Introduction: (CU4 M2) The Female Reproductive System
  Reading: (CU4 M2) Chapter 17 The Female Reproductive System
  Lecture Materials: (CU4 M2) The Female Reproductive System
  Self-check: (CU4 M2) Chapter 17 The Female Reproductive System
  Competency Assessment: (CU4 M2) Define Medical Terms and Abbreviations Related to All Body Systems
  Competency Assessment: (CU4 M2) ANSWER KEY Define Medical Terms
  Activity: (CU4 M2) Definition Practice
  Competency Assessment: (CU4 M2) Chapter 17 Review
  Activity: (CU4 M2) Chapter 16 & 17 Review
  Congratulations! (CU4 M2)
END of Credit Unit 4
  CMA 102 Credit Unit Assessment (CU4)
END of Course CMA 102
  End of Course