Title: Competency Assessment: (CU2 M2) Ch.4
Course: SkillsCom BA 285 15.0 > Section: Credit Unit 2 Module 2

There are three parts to this Competency Assessment. Part 1 is essay questions, Part 2 is a small case study with a video, and Part 3 is a case study. Complete all questions in an MS Word document, and submit it when finished.

Part 1 (Google Doc)

Part 2 (Google Doc)

Part 3 (Google Doc)