Title: Activity: (CU4 M3) Chapter 17
Course: SkillsCom BA 112 16.0 > Section: Credit Unit 4 Module 3

Complete the following:

Chapter 17:

- Exercise E17A-1
- Problems P17A-1, P17A-2, P17A-3, P17A-4, and P17B-4

To access Activity, open MyAccountingLab (Publisher Content) and select "MyAccountingLab Course Home" under "Student links." On the left sidebar within the MyAccountingLab menu, select "Assignments." Then select "Do Homework" and select "Chapter 17 Homework."