Title: Reference List - Smart Grid
Course: Critical Infrastructure: An Overview > Section: Course Content

Reference List

[1] | Energy.gov, "Smart Grid," 2014. [Online]. Available: http://energy.gov/oe/services/technology-development/smart-grid. [Accessed 2014].
[2] | Federal Energy Regulatory Commission, "Assessment of Demand Response & Advanced Metering: Staff Report," December 2008. [Online]. Available: http://www.ferc.gov/legal/staff-reports/12-08-demand-response.pdf.
[3] | Energy.gov, "Tips: Smart Appliances," 24 April 2012. [Online]. Available: http://energy.gov/energysaver/articles/tips-smart-appliances.
[4] | Smartgrid.gov, "Green Button Gives Millions of Consumers Access to Electricity Usage Information," [Online]. Available: https://www.smartgrid.gov/federal_initiatives/featured_initiatives/green_button_gives_millions_consumers_access_electricity_usage_information.
[5] | Energy.gov, "Answering Your Questions about Grid Modernization," 18 June 2013. [Online]. Available: http://energy.gov/articles/answering-your-questions-about-grid-modernization.