Title: References
Course: 2016FA-MCO-115-401 > Section: Module 15: Commercial Facilities

References
Reference Number | Reference Information
[1] | Department of Homeland Security, "Commercial Facilities Sector," dhs.gov, 10 June 2014. [Online]. Available: http://www.dhs.gov/commercial-facilities-sector. [Accessed 25 July 2014].
[2] | Department of Homeland Security, "Commercial Facilities Sector Specific Plan," dhs.gov, 2010. [Online]. Available: http://www.dhs.gov/xlibrary/assets/nipp-ssp-commercial-facilities-2010.pdf. [Accessed 25 July 2014].
[3] | Department of Homeland Security, "Washington Infrastructure Protection Plan," [Online]. Available: www.emd.wa.gov/plans2008_WIPP.pdf. [Accessed 2014].
[4] | D. J. Hanford, "Facility Managers Should Reassess Security Plans as Terrorist Networks Become Decentralized," FacilitiesNet, August 2010. [Online]. Available: http://www.facilitiesnet.com/security/article/Facility-Managers-Should-Reassess-Security-Plans-as-Terrorist-Networks-Become-Decentralized--11913?source=next. [Accessed 28 July 2014 ].