Title: Unit 2 Self Assessment
Course: Introduction to Mission Critical > Section: Introduction to Mission Critical

Q: One way to save money from building automation would be the reduction of HVAC costs that come from efficient temperature and humidity monitoring and control found in an automated building.
- True
- False
A: True
If right: That is correct, this is more cost effective than hiring someone specifically to control HVAC systems when temperature and humidty levels change.
If wrong: The answer in this case should be true. It is more cost effective than hiring someone specifically to control HVAC systems when temperature and humidty levels change.

Q: An Engineering Technologist often does what?
- implements designs
- designs things
- draws mechanical drawings of designs
- makes necessary repairs to plumbing, HVAC, and electrical systems at a facility
A: implements designs
If right: Yes, the Engineering Technologist often implements the designs that an engineer has come up with.
If wrong: No, the Engineering Technologist often implements the designs that an engineer has come up with.

Q: Two mission critical sites mentioned that require a more ideal temperature and humidity are server farms and ______________________.
- Data Centers
- HVAC companies
- software sales locations
A: Data Centers
If right: Great! Yes, the best answer is, "Data Centers".
If wrong: The best answer is "Data Centers" since it is a mission critical facility and the electronic contained in Data Centers generally requires cooler temperatures and a more ideal humidity.

Q: Building automation provides a way to monitor the functions of different systems in a building, but it may require more human intervention and an increase in expenses.
- True
- False
A: False
If right: Correct, this is false. Building automation can help things in a buiding be monitored and maintained at a more efficeint, energy saving, and money saving level. With building automation less human intervention can be made possible in some cases.
If wrong: This is false. Building automation can help things in a buiding be monitored and maintained at a more efficeint, energy saving, and money saving level. With building automation less human intervention can be made possible in some cases.

Q: Computers and other electronic components are networked together to help control a building in building automation.
- True
- False
A: False
If right: Correct!
If wrong: Incorrect. It is true that computers and other electronic components are networked together to help control a building in building automation.

Q: The area of study that focuses on applying theories, concepts, and principles to existing areas of interest or to solve existing problems is called:
- Engineering Technology
- Facilities Maintenance
- HVAC
- Access Control
A: Engineering Technology
If right: Correct, Engineering Technology is the area of study that focuses on applying theories, concepts, and principles to existing areas of interest or to solve existing problems.
If wrong: Engineering Technology is the area of study that focuses on applying theories, concepts, and principles to existing areas of interest or to solve existing problems.