Title: Unit 2 : Operations Technology
Course: Introduction to Mission Critical > Section: Introduction to Mission Critical

Unit 2: Operations Technology

In this unit, we will learn more about the Operations Technology side of MCO.

Unit 2 Time Advisory:

This unit should take you approximately an hour to complete.
- Subunit 2 – 1 : 20 to 30 minutes
- Subunit 1 – 2 : 15 to 20 minutes

Unit 2 Learning Outcomes:

Upon successful completion of this unit, student will be able to:
- Name several OT MCO related careers from both the Facilities Maintenance and the Engineering Technology functions
- Demonstrate a familiarity with automation and building automation
- Name some different industries that use Operations Technology

2.1 Operations Technology

Reading: Operations Technology Overview
Reading: Facilities Maintenance Functions
Reading: Operations Technology Chart
Video: TED x Manitoba - Scott Stirton - Intelligent Buildings
Reading: What is Automation?
Reading: Robotic Cake Decorator

2.2 Engineering Technology

Reading: Engineering Technology Functions
Reading: FAQs About Engineering and Engineering Technology

Unit 2 Self Assessment