Title: 2.1 - TEDxManitoba - Scott Stirton - Intelligent Buildings
Course: Introduction to Mission Critical > Section: Introduction to Mission Critical

Scott Stirton is an architect and the Chief Executive Officer of Smith Carter Architects and Engineers, a national architectural practice specializing in the design of high performance buildings headquartered in Winnipeg, Manitoba.

Scott's passion for pushing the profession of architecture beyond traditional expectations is demonstrated in his 20 year history designing high containment laboratories and specialized healthcare environments in Canada, the U.S. and around the globe. In his capacity as CEO he has expanded the firms reach into groundbreaking projects collaborating with some of the world's most advanced engineers and technology companies.

In this video, Scott explains how building automation can create a more efficient, more environmentally friendly future for industry and critical infrastructure. This kind of building automation and related elements are key to keeping current businesses running.

Watch this video on Youtube: TEDxManitoba - Scott Stirton - Intelligent Buildings

Tedx Talks are licensed CC-BY NC ND