Title: Class Outline 16
Course: KVCC BUS214 > Section: Class Outlines

Physical Security

1.      Factors

a.      Prevention

b.      Detection

c.      Recovery

2.      Considerations

a.      Restricting Physical Access to facilities and computer systems

b.      Preventing interruptions of computer services cause by problems

c.      Preventing unauthorized disclosure of information

d.      Disposing of sensitive material

e.      Protecting the interior and exterior of your facility

3.      Physical Controls

a.      Perimeter barriers

b.      Cameras

c.      Doors

i.           Mantrap

ii.           Turnstile

iii.           Double Entry

d.      Door locks

i.           Keypads

ii.           Smart cards

iii.           Proximity cards/RFID

iv.           Biometric

e.      Sign in

f.       Access controls

i.           Anti-passback

ii.           Sensors

g.      Protected Cable distribution

i.           Hardened Carrier PDS

ii.           Alarmed Carrier PDS

iii.           Continuously viewed carrier PDS

4.      Physical Security sequence

a.      Deter access attempts

b.      Deny physical access

c.      Detect intrusions

d.      Delay the violator long enough for a response

5.      Tailgating and Piggybacking

6.      Hardware Security

a.      Policies

i.           Equipment Checkout

b.      Room Security

c.      Hardware locks

d.      Backup storage

Attached Files: | - KVCC BUS214_InfoSystemsSecurity_Outline 16.pdf